Objective

Ring and call waiting tone specs are used to identify a specific ring tone or number dialed to make a call on a phone. The ring and call waiting tone spec configuration are dependent on the ring waveform, ring voltage and ring frequency. This feature is used to customize various ring and call tone settings on a SPA8000 Adapter Phone. This document outlines the procedures to configure ring and call waiting tone specs on a SPA8000.

Applicable Device

- SPA8000

Software Version

- 6.1.12

Ring and Call Waiting Tone Settings

Step 1. Log in to the web configuration utility as an administrator and choose Admin Login > Advanced > Voice > Regional. The Regional page opens:

Step 2. From the Ring Waveform drop-down list, choose the type of waveform for the ringing signal.

- Sinusoidal — The ring style waveform is sinusoidal.

- Trapezoid — The ring style waveform is trapezoidal. A trapezoid ring waveform is easier to generate than a sinusoidal ring waveform.

Step 3. In the Ring Frequency field, enter the desired value for the ring frequency to have. The value is in hertz and has a valid range from 10-100 Hz. It is set at 20 by default.

Step 4. In the Ring Voltage field, enter the value between the valid range of 60-90 volts. It is set at 85 by default.

Step 5. Enter a Call Wait Tone (CWT) Frequency as a frequency script of the call waiting tone. A frequency script is a sequence of frequencies and their corresponding levels. It is set as 440@-10 by default. All the distinctive CWTs are based on this tone.

Step 6. Choose yes or no from the Synchronized Ring drop down list to synchronize the ring tones. It is set as no by default.

Step 7. Click Submit All Changes to save the configuration.