Objective

Remote management allows you to manage the SPA8000 from a remote location via the Internet. With remote management, you can access the administration web server from a computer that is not directly connected to the SPA8000. The objective of this article is to explain how to configure remote management on the SPA8000 Analog Telephone Adapter.

Applicable Device

• SPA8000 Analog Telephone Adapter

Software Version

• 6.1.12

Configuration of Remote Management

Step 1. Log into the web configuration utility as an administrator or user and choose Advanced > Network > WAN Status. The WAN Status page opens:

Step 2. Scroll down to the Remote Management section.

Step 3. Choose yes from the Enable WAN Web Server drop down list to enable the WAN Web Server. This allows access to the administration web server from a computer which is not directly connected to the phone adapter. The default value is yes.

Step 4. Enter the WAN web server port in the WAN Web Server Port field. The WAN Web Server Port is used for WAN access to the ATA device. The default value is 80.

Step 5. Click Submit All Changes to save the settings.