Objectives

A ring tone is played whenever the IP phone receives a phone call. The phone comes preloaded with an assortment of ring tones. The ring tone that plays can be changed and different extensions can each be assigned a unique ring tone.

This document explains how to change the ring tone on SPA525G/SPA525G2 IP Phones.

Applicable Devices

• SPA525G IP phone

• SPA525G2 IP phone

Step-by-Step Procedure

Change Ring Tone on IP Phone

Step 1. Press the Setup button on the IP phone to bring up the Information and Settings menu.

Step 2. Scroll up and down with the navigation keys to select User Preferences. Press Select to bring up the User Preferences menu.

Step 3. Scroll up and down with the navigation keys to select Ring Settings. Press Select to bring up the Ring Tone menu.

Step 4. Scroll up and down with the navigation keys to select the Default Ring or to assign a ring tone to a specific extension. Press Select to choose a ring tone.

Note: Changing the default ring will change the ring tone for every extension that was not manually assigned a ring tone.

Step 5. Scroll up and down with the navigation keys to select a ring tone. Press Play to listen to the selected ring tone. Press Select to choose the selected ring tone.