Objective

The data and time in SPA302D is synchronized with the SPA232D base. However, you can also edit it manually if the synchronization is not correct.

This article explains how to edit date and time settings on the SPA302D mobility enhanced handset.

Applicable Device

• SPA302D Handset

Software Version

• v2.31

Tone Settings

Step 1. On the home screen, press the Select button to choose the Settings icon. The selection will be highlighted with a black outline as shown in the above image.

Step 2. On the Settings menu, choose Date/time with the use of up and down navigation buttons and press the Select button.

Step 3. Use left and right navigation buttons to change the value of each field.

• Month

• Day

• Year

• Hour

• Minute

• AM/PM

• Format

Step 4. Press the Save softkey to save the selection.