Objectives

The Admin VLAN ID is the auxiliary VLAN in which the phone is a member. It overrides the value specified by the Operation VLAN ID parameter.

This document explains how to configure the Admin VLAN Id on the SPA300 and SPA500 Series IP Phones.

Applicable Devices

• SPA300 Series

• SPA500 Series

Admin VLAN Id

Step 1. Press the Setup button to open the Setup menu.

Step 2. Press 3 on the keypad or navigate to Settings.

Step 3. Press 4 on the keypad or navigate to Network Configuration.

Step 4. Navigate to Admin VLAN Id.

Step 5. Press the << button to delete all previous configurations.

Step 6. Type in the new Admin VLAN Id using the keypad.

Step 7. Press OK to save your changes.