Objectives

Whenever a call is missed, the name of the caller, extension number of the caller, date and time of the call is recorded. The missed calls can be viewed without being directly in front of the phone by using the web interface of the IP Phone.

This document explains how to view missed calls through the web interface on the SPA300/SPA500 Series IP Phone.

Applicable Devices

• SPA300 Series IP Phone

• SPA500 Series IP Phone

Step-by-Step Procedure

View Missed Calls Through the Web Interface

Step 1. Connect the computer to the IP phone through the PC port on the back of the phone, or to a port on the device that manages the IP phone.

Step 2. Enter the IP address of the phone into the web browser to access the web interface of the phone.

Step 3. Choose the Call History tab. The Call History page opens.

Step 4. Choose the Missed Calls tab. The Missed Calls page opens.

Step 5. The name of the caller, extension number of the caller, date, and time of each missed call is displayed.