Summary

When upgrading the firmware from version 1.4.2.04 to version 1.4.5.02, the whole stack reboots.

Date Identified

September 30, 2016

Date Resolved

March 31, 2017

Products Affected

Model

Firmware Version

SG500-52P

1.4.2.04

Issue Description

The whole stack of six SG500-52P switches rebooted when trying to upgrade from firmware version 1.4.2.04 to version 1.4.5.02.

Resolution

Upgrade to the latest firmware version 1.4.7.06.