Objective

SNMP is a network management protocol which is used for managing network devices. It helps to record, store and share the information of various devices in the network that facilitates the administrator to solve the network issues quickly. SNMP uses Management Information Bases (MIBs) to store available information in a hierarchical manner. You can configure SNMP users. This users will be part of a SNMP group, which gives the users the SNMP attributes and access privileges. This article explain how to create SNMP users on the 300 Series Managed Switches.

Note: SNMP must be enable on the switch to work properly. For more information  on how to enable SNMP refer to the article Enable Simple Network Management Protocol (SNMP) Service on 300 Series Managed Switches.

Applicable Devices

• SF/SG 300 Series Managed Switches

Software Version

• 1.3.0.62

SNMP User Configuration

Step 1. Log in to the web configuration utility and choose choose SNMP > Users. The Users page opens:

Step 2. Click Add. The Add User window appears.

Step 3. Enter a username for the user in the User Name field.

Step 4. Click the specific radio button to choose the appropriate Engine ID. The engine ID is the device that provides SNMP capabilities to the user. The available options are:

• Local — This option chooses the local switch as the engine ID.

• Remote IP Address — This option chooses the IP of an already configured engine ID which provides SNMP capabilities to the users of the switch.

Note: For more information on how to configure an engine ID, refer to the article Configure Simple Network Management Protocol (SNMP) Engine ID on 300 Series Managed Switches.

Step 5. Choose from the Group Name drop-down list, the SNMP group to which you wish this user to be part of.

Note: For more information on how to create a SNMP group, refer to the article Simple Network Management Protocol (SNMP) Group Configuration on a 300 Series Managed Switch.

Step 6. Click the radio button of an authentication method. The available options are:

• None — No user authentication is used.

• MD5 Password — The password which is provided by the user is encrypted using the MD5 authentication method. MD5 is a cryptographic hash function which has a 128-bit hash value and is commonly used for data integrity.

• SHA Password — The password which is provided by the user is encrypted using the Secure Hash Algorithm (SHA)  authentication method. Hash functions are used to convert an input of arbitrary size to an output of fixed size which would be a 160-bit hash value.

Step 7. Click the radio button of an authentication password option in the Authentication Password field. The available options are:

• Encrypted — This option lets you enter an already  encrypted password.

• Plaintext — This option lets you enter a password as a plain text.

Step 8. Click the radio button of a privacy method in the Privacy Method field. The available options are:

• None —The privacy  password is not encrypted.

• DES —The privacy password is encrypted with the Data Encryption Standard (DES). DES is a standard which takes a 64 bit input value and uses a 56-bit key for encryption and decryption of the messages. It is a symmetric encryption algorithm where the sender and the receiver use the same key.

Step 9. Click the radio button to enter a privacy password in the Privacy Password field. The available options are:

• Encrypted —This option lets you enter an encrypted privacy password

• Plaintext —This option lets you enter a privacy password as a plain text.

Step 10. Click Apply to save your configuration.

Step 11. (Optional) To edit a user, check the check box of the user you wish to edit and click Edit.

Step 12. (Optional) To delete a user, check the check box of the user you wish to delete and click Delete.