Objective

A queue is used to store traffic until the switch is free to process it.  Each port/LAG on the switch has four ingress (input) queues and four egress (output) queues.  The egress rate is the rate in which packets are sent out from the switch.  An egress rate limit can be performed on a per-queue per-port basis. This means that the egress rate can be limited for each specific queue on every port on the switch.  Egress shaping is a form of an egress rate limit.  Egress shaping is useful for when a destination expects a smooth flow of data as opposed to irregular bursts of data. The switch can limit all frames except for management frames. This article explains how to configure egress shaping per queue on 200/300 series switches.

Applicable Devices

• SF/SG 200 and SF/SG 300 Series Managed Switches

Software Version

• 1.3.0.62

Configure Egress Shaping per Queue

Step 1. Log in to the web configuration utility and choose Quality of Service > General > Egress Shaping per Queue. The Egress Shaping Per Queue page opens:

Step 2. From the Interface Type drop-down list, choose Port to have a list of ports displayed or choose LAG to have a list of link aggregations displayed and click Go.

Step 4. Click the radio button of the Port/LAG that you wish to edit.

Step 5. Click Edit to edit the parameters.  The Edit Egress Shaping Per Queue window appears:

Step 6. Click either Port to choose a specific port or click LAG to choose a link aggregation (bundle of ports).

Step 7. From the Interface drop-down list, choose the Port/LAG you would like to edit.

Step 8. For queues 1-4, check the Enable check box for each queue that you wish to enable egress shaping.

Step 10. In the Committed Information Rate (CIR) field, enter the maximum rate of data that can be sent in kilobits per second (kbps). The value ranges from 64 to 1000000 kpbs.

Step 11. In the Committed Burst Size (CBS) field, enter the maximum burst size of data that can be sent in bytes. The value ranges from 4096 to 16762902 bytes. CBS is the amount of data that is allowed to be sent if a burst of data exceeds the CIR.

Step 12. Click Apply to save the settings and then click Close to exit the Edit Egress Shaping Per Queue window, or click Close to discard the settings.

Copy Egress Shaping per Queue

Step 1. Log in to the web configuration utility and choose Quality of Service > General > Egress Shaping per Queue. The Egress Shaping per Queue page opens:

Step 2. From the Interface Type drop down list, choose Port to have a list of ports displayed or choose LAG to have a list of link aggregations displayed and the click Go.

Step 4. Click the radio button of the Port/LAG that you wish to edit.

Step 5. Click Copy Settings to copy the settings of the selected Port/LAG to another Port/LAG.  The Copy Settings window appears:

Step 6. In the Copy configuration field, enter the Ports/LAGs to which you wish to copy the settings of the selected port.

Step 7. Click Apply to save the settings or click Close to discard the settings.