Date Identified

May 23, 2017

Date Resolved

March 30, 2018

Products Affected

Model

Firmware Version

SG350X

2.2.0.X

Problem Description

Egress traffic shaping on XG device uplink interfaces limits traffic to 80 Kbps, even if you configured a lower rate.

Workaround

Use an egress shaping value higher than 80 Kbps.

© 2017 Cisco Systems, Inc. All rights reserved.