Date Identified

May 23, 2017

Date Resolved

N/A

Product Affected

Model

Firmware Version

SG350XG

2.2.0.x

Problem Description

Some of the functions in the web-based utility of the switch are not working when using the Apple Safari browser. These functions in the utility that do not respond include the Reboot and Logoutbuttons, as well as the Stop button of Locate Device page.

Workaround

Use other browsers such as Google Chrome, Mozilla Firefox, or Microsoft Edge.