Date Identified

August 19, 2016

Date Resolved

June 5, 2017

Product Affected

Model

Firmware Version

Fixed In

SG350XG

2.2.0.x

2.3.0.130

Problem Description

In some cases, if a switch has preconfigured 802.1X or Remote Authentication Dial-In User Service (RADIUS) configurations through the Command Line Interface (CLI) or via the web-based utility, the display or configuration via Device Authorization Control (DAC) may fail.

Resolution

This issue is fixed when you upgrade to the firmware version 2.3.0.130. To upgrade, click here for instructions.