Date Identified

May 23, 2017

Date Resolved

June 12, 2017

Product Affected

Model

Firmware Version

Fixed In

SG350XG-2F10

2.2.0.x

2.2.0.66

SG350XG-24F

2.2.0.x

2.2.0.66

SG350XG-24T

2.2.0.x

2.2.0.66

Problem Description

The show queue statistics command may show incorrect information on the number of packets and bytes. This happens among SG350XG devices with less than 48 ports.

Resolution

This issue is fixed when you upgrade to the firmware version 2.2.0.66. To upgrade, click here for instructions.