Date Identified

May 23, 2017

Date Resolved

N/A

Product Affected

Model

Firmware Version

SG350XG

2.2.0.x

Problem Description

Smart Network Application (SNA) does not release Random Access Memory (RAM) correctly when it is left open for a long period of time such as leaving it on overnight which causes a web browser to freeze due to lack of RAM.

Current Status

There is no known workaround.