Objective

The objective of this article is to go through the day zero setup of a Catalyst 1200 or 1300 switch using the command line interface (CLI).

Applicable Devices | Software Version

- Catalyst 1200 | 4.0.0.91 (Data Sheet)

- Catalyst 1300 | 4.0.0.91 (Data Sheet)

Introduction

Are you looking for an affordable and easy to deploy switch for your small or medium-sized business? The Cisco Catalyst 1200 and 1300 switches fit the bill that also provide advanced switching capabilities, enhanced security, and can be easily managed using the Cisco Business Dashboard or the Cisco Business mobile App.

Check out the following pages for more information on the Catalyst 1200 and 1300 switches.

- Why Upgrade to Cisco Catalyst 1200 or 1300 Series Switches Feature Comparison

- Cisco Catalyst 1200 and 1300 Series Switches At-a-Glance

You can also refer to the following hardware installation guides to get started.

- Cisco Catalyst 1200 Hardware Installation Guide

- Cisco Catalyst 1300 Hardware Installation Guide

Let’s begin with the day zero setup of a Catalyst 1200 or 1300 switch using the CLI.

Day zero setup

Step 1

In this example, a Catalyst 1300 switch is used. Connect to the switch via a console cable.

Step 2

Press Enter twice on the keyboard to complete the console baud-rate auto detection process. This is necessary to identify the speed of console connection and to send data at the proper rate.

Step 3

Enter the default username. As this is a day zero setup, it is cisco.

User Name : cisco

cisco is all lowercase letters.

Step 4

Enter the default password which is also cisco.

Password: cisco

Step 5

You will be prompted to enter a new username. In this example, it is admin.

Enter new username: admin

Step 6

Enter a new password. The password must meet the standard requirements.

- The password must be at least eight characters and must contain three of the four following options: uppercase, lowercase, a number, or a special character.

- A character cannot be repeated more than three times in a row.

- It cannot have more than two sequential characters or numbers in a row and the characters are case insensitive.

- You cannot use the username as the password or the reversed or modified form of the username.

- "Cisco" or variations of the word "Cisco" cannot be used in any part of the password (beginning, middle or end).

- Well-known usernames and passwords will not be accepted.

- The word “password" cannot be used as the beginning of your password and it is case insensitive.

- The word “Catalyst” cannot be any part of the password.

- Using more than three repeated characters in a row is not allowed. For example, 111 will not be accepted.

- Using more than two sequential characters in a row like 123 will not be allowed.

If you enter a password that doesn’t comply with the rules like Cisco123, it’ll be rejected along with an explanation of why the password was rejected.

Step 7

To set an IP address, enter config terminal and in this example, interface VLAN1 will be configured.

switch# config terminal

switch(config) # interface Vlan1

Step 8

Enter the command ip address followed by the IP and the subnet mask. In this example, it’s 172.16.1.11 with a subnet mask of 255.255.255.0.

switch (config-if) # ip address 172.16.1.111 255.255.255.0

Step 9

Specify the ip route. In this example, it’s going to be the default gateway of 0.0.0.0 as the destination prefix, with 0.0.0.0 as the network mask followed by the IP address of the network.

switch (config) # ip route 0.0.0.0 0.0.0.0 172.16.1.60

Step 10

To enable SSH clients, type ip ssh-client authentication password that allows the use of usernames and password to authenticate via SSH.

switch(config) # ip ssh-client authentication password

Step 11

Exit the configuration mode to get back to the privileged execution mode.

switch (config) #exit

Step 12

Enter write memory to save the configuration.

switch# write memory

Step 13

Enter Y to confirm.

Overwrite file [startup-config].... (Y/N) [N] ? Y

Conclusion

There you go! You have completed the basic initial configuration of your Catalyst 1200/1300 switch using the CLI.

For other configurations and features, refer to the Catalyst series Administration Guide.

View a video related to this article...

Click here to view other Tech Talks from Cisco