Objective

System Statistics is a record which contains the information about the device name, status, network traffic of the wired and wireless connections on a network device. This document explains how to view the system statistics on RV016, RV042, RV042G and RV082 VPN Routers.

Applicable Devices

• RV016

• RV042

• RV042G

• RV082

Software Version

• v4.2.1.02

View System Statistics

Step 1. Log in to the Router utility configuration and choose Log > System Statistics. The System Statistics page opens:

Statistics appear for each interface, such as LAN, WAN1, WAN2 or DMZ.

The following fields are displayed.

• Device Name —Port ID that the interface uses.

• Status — Port status in the interface. The possible values are Connected, Disconnected, Enabled, or Disabled.

• IP Address — IP address of the interface.

• MAC Address — MAC address of device that it is connected to the interface..

• Subnet Mask — Subnet mask that the connected device uses.

• Default Gateway —The default gateway that the connected device uses.

• DNS — The DNS server for DNS name resolution.

• Received Packets — Number of packets received through the specific interface.

• Sent Packets — Number of packets sent through the specific interface.

• Total Packets — Total number of packets sent and received through the specific interface

• Received Bytes — Number of bytes received through the specific interface.

• Sent Bytes — Number of bytes sent through the specific interface.

• Total Bytes — Total number of bytes sent and received through the specific interface.

• Error Packets Received — Number of error packets received through the specific interface.

• Dropped Packets Received — Number of received packets that were dropped.

Step 2. (Optional) To update the data, click Refresh.