Special Notice: Licensing Structure - Firmware versions 1.0.3.15 and later. Moving forward, AnyConnect will incur a charge for client licenses only.

For additional information on AnyConnect licensing on the RV340 series routers, check out the article AnyConnect Licensing for the RV340 Series Routers.

Introduction

The RV340W Dual WAN Gigabit VPN Router with Wireless is a part of the RV34x Series and is the wireless counterpart of the RV340 Router. It is easy-to-use, flexible, high-performance, and durable which makes this well suited for small businesses. Now with several added security features such as Web Filtering, Application Control, and IP Source Guard, the RV340W delivers highly secure, broadband, wired and wireless connectivity to small offices and remote employees. These new security features also provide the ease of fine-tuning permitted activity on the network.

This article aims to showcase the product specifications of the RV340W Dual WAN Gigabit VPN Router with Wireless.

Note: To know more about the RV340W Dual WAN Gigabit VPN Router with Wireless, click here.

Product Specifications

Specifications

Description

Standards

802.11 (Wi-Fi), 802.11ac, 802.1n, 802.11g, 802.11b, 802.11a, 802.3u, 802.1D, 802.1p, 802.1w (Rapid Spanning Tree), 802.1X (security authentication), 802.1Q Virtual Local Area Network (VLAN), IPv4 (RFC 791), IPv6 (RFC 2460), Routing Information Protocol (RIP) v1 (RFC 1058), RIP v2 (RFC 1723)

Operating System

Linux

Cabling Type

Category 5e or better

Ports

LAN, WAN, USB, Console

Physical Interfaces

Specifications

Description

Ports

4 RJ-45 10/100/1000 Ethernet

2 WAN

2 USB ports

1 Console

Buttons

Reset button, Wi-Fi button

Switch

Power Switch

Physical Security

Kensington

Yes

Physical Specifications

Physical dimensions

(W x D x H)

280 x 44 x 170 mm (11.0 x 1.45 x 6.69 in)

Weight

1.2 kg (2.65 lbs)

Network Capabilities

Specifications

Descriptions

VLAN Support

Yes; Port-based and 802.1Q tag-based VLANs

Network Protocols

Dynamic Host Configuration Protocol (DHCP) server

Point-to-Point Protocol over Ethernet (PPPoE)

Point-to-Point Tunneling Protocol (PPTP)

Domaine Name System (DNS) proxy

Internet Group Management Protocol (IGMP) proxy and multicast forwarding

Rapid Spanning Tree Protocol (RSTP)

Dynamic Domain Name System (DynDNS, NOIP)

Network Address Translation (NAT), Port Address Translation (PAT)

One-to-one NAT

Port management

Port mirroring

Number of VLANs

1 management VLAN (1-4096 range), up to 32 VLANs

802.1X supplicant

Yes

Routing Protocols

Static routing

Dynamic routing

RIP v1 and v2

NAT

PAT, Network Address Port Translation (NAPT) protocol

Network edge (DMZ)

Software-configurable to any LAN IP address

Spanning tree

Yes

Load balancing

Yes

IPv6

Dual-stack IPv4 and IPv6

6to4 tunneling

Stateless address auto-configuration

DHCPv6 Server for IPv6 Clients on LAN

DHCP v6 client for WAN connectivity

Internet Control Message Protocol (ICMP) v6

Static IPv6 Routing

Dynamic IPv6 Routing with RIPng

IPv6 host support

IPv6 RADIUS,

Network Time Protocol (NTP)

Layer 2

802.1Q-based VLANs, 32 active VLANs plus one management VLAN

Security

Specifications

Description

Access control

Yes, management access control list (ACL) plus MAC ACL

Secure Management

HTTPS

Firewall

Stateful packet inspection (SPI) firewall, port forwarding and triggering, Denial-of-Service (DoS) prevention, software-based DMZ

DoS attacks prevented:

- SYN Flood

- Echo Storm

- ICMP Flood

- UDP Flood

- TCP Flood

Blocks Java, cookies, active-X, HTTP proxy

Web Filter

Filters malicious and blocks harmful websites

Content Filter

Static URL blocking or keyword blocking

Application Control

Yes

VPN

Specifications

Description

IPSec

50 simultaneous connections (any combination of Remote Access and site-to-site), up to 650 Mbps throughput

IPSec Remote Access

Yes

L2TP over IPSec

Yes

GRE over IPSec

Yes

Cisco SSL VPN (Cisco AnyConnect)

2 tunnels included. Max 50 tunnels with optional router licenses. Up to 33 Mbps throughput

PPTP

25 connections, up to 100 Mbps throughput

Teleworker mode (Cisco IPSec VPN)

Router acts as a client to connect to central VPN gateway in teleworker mode.

VPN Passthrough

IPSec, PPTP, L2TP

Configuration

Specifications

Description

Web user interface

Simple, browser-based configuration (HTTP, HTTPS)

Command-line interface (CLI)

Command line using SSH

Management protocols

Web browser, Simple Network Management Protocol (SNMP) v3, Bonjour

Remote management

Yes

Event logging

Local, remote syslog , email alerts

Network diagnostics

Logging, Ping, Traceroute, DNS lookup, and Port Mirror

Web firmware upgrade

Firmware upgradable through web browser, imported and exported configuration file

Dynamic Host Configuration Protocol (DHCP)

DHCP Client

IPv6 host

Yes

HTTP redirect

Yes

System time

Supports NTP, daylight savings manual entry

Languages

GUI supports English

Wireless

Specifications

Description

Radio and modulation type

Dual radio, Orthogonal Frequency Division Multiplexing (OFDM) IEEE 802.11a/n: OFDM (BPSK/QPSK/16QAM.64AM/256AM)

IEEE 802.11ac: OFDM (BPSK/QPSK/16QAM.64AM/256AM)

WLAN

802.11n/ac

4x4 MIMO with 2 spatial streams at 5 GHz

3x3 MIMO with 2 spatial streams at 2.4 GHz

20-, 40-, and 80-Mhz channels for 802.11ac

20- and 40-Mhz for 802.11n

PHY data rate up to 2.7Gbps:

- 2.4 GHz: 450Mbps (64-QAM), 600Mbps (256-QAM)

- 5 GHz: 1.7Gbps (256-QAM), 2.1Gbps (1024-QAM)

802.11 Dynamic Frequency Selection (DFS)

Operating channels

11 North America, 13 most of Europe, auto-channels selection

Wireless isolation

Wireless isolation between clients

External antennas

4

Antenna gain in dBi

2.4 GHz: 3 dBi per antenna

5 GHz: 5 dBi per antenna

Receiver sensitivity

2.4 GHz:

-802.11b: -82 dBm at 11 Mbps,

-802.11g: -71 dBm at 54 Mbps,

802.11n (HT20): -69 dBm at MCS7,

HT20, -65 dBm at mcs15, HT40

5 GHz:

-802.11ac (VHT20): -59 dBm at MCS8

-802.11ac (VHT40): -54 dBm at MCS9

-802.11ac (VHT80): -51 dBm at MCS9

Radio frequency

Dual-band, works on 2.4 GHz and 5 GHz

Active WLAN clients

Supports up to 50 concurrent clients

Multiple SSIDs

Supports multiple Service Set Identifiers (SSIDs), up to 8 separate virtual networks, 4 per radio.

Wireless VLAN Map

Supports SSID to VLAN mapping with wireless client isolation

WLAN Security

Wired Equivalent Privacy (WEP), WPA, WPA2-PSK, WPA2-ENT, 802.11i

Wi-Fi Multimedia (WMM)

WMM, WMM power save (WMM-PS)

Environmental

Specifications

Description

Power

12V 1.5 A

Certifications

FCC, CE, IC, Wi-Fi

Operating temperature

0° to 40°C (32° to 104°F)

Storage temperature

0° to 70°C (32° to 158°F)

Operating humidity

10% to 85% non-condensing

Storage humidity

5% to 90% non-condensing