Objective

The Cisco RV130W Wireless Multifunction VPN Router with Web Filtering is an easy-to-use, flexible, high-performance device well suited for small businesses. Now with web filtering, the new RV130W delivers highly secure, broadband, and wireless connectivity to small offices and remote employees. It can also be used either as a standalone wireless router, access point, bridge, or repeater for flexible deployments, offering investment protection as your business needs to evolve.

This article aims to provide product specifications about the RV130W Wireless Multifunction VPN Router with Web Filtering.

Note: To know more about the RV130W Wireless Multifunction VPN Router with Web Filtering, click here.

Product Specifications

Specifications

Description

Standards

IEEE 802.11a, 802.11n, 802.11g, 802.11b, 802.3, 802.3u, 802.1X (security authentication), 802.1Q (VLAN), 802.1D (Spanning Tree), 802.11i (WPA2 security), 802.11e (wireless QoS), Routing Information Protocol (RIP) v1 (RFC 1058), RIP v2 (RFC 1723), IPv4 (RFC 791), IPv6 (RFC 2460)

Operating System

Linux

Antennas

2 flexible external antennas

Cabling Type

Category 5e or better

Physical Interfaces

Specifications

Description

Ports

4 – 10/100/1000 Mbps Gigabit LAN ports with managed switch, WAN, USB, 12VDC power adapter port

Buttons

Reset button, Power button

LEDs

Power, VPN, LAN (1-4), WAN, USB, and WLAN

Lock Slot

Slot for Kensington lock

Physical Specifications

Physical dimensions

(W x D x H)

149.86 x 29.9 x 150.11 mm (8.9 x 3.4 x 8.7 in)

Weight

0.72 kg (1.6 lb)

Network Capabilities

Specifications

Description

VLAN Support

Yes

Network Protocols

Dynamic Host Configuration Protocol (DHCP) server

Point-to-Point Protocol over Ethernet (PPPoE)

Point-to-Point Tunneling Protocol (PPTP)

DNS proxy

Internet Group Management Protocol (IGMP) proxy and multicast forwarding

Rapid Spanning Tree Protocol (RSTP)

Dynamic Domain Name System (DynDNS), No Internet Protocol (NOIP)

Network Address Translation (NAT), Port Address Translation (PAT)

Software-configurable DMZ to any LAN IP address

One-to-one NAT

Port management

Port mirroring

Bonjour

Number of VLANs

5 active VLANs (3-4096 range)

WLAN

Built-in high-speed 802.11n Wireless Access Point

802.1X supplicant

Yes

Routing Protocols

Static routing

Dynamic routing

RIP v1 and v2

Inter-VLAN routing

Network Address Translation (NAT)

PAT, Network Address Port Translation (NAPT) protocol

Network edge (DMZ)

Software-configurable to any LAN IP address

Spanning tree

Yes

Load balancing

Yes

Quality of Service (QoS)

WAN Queuing

3 queues

Differentiated Services Code Point Support (DSCP)

Class of Service (CoS)

Bandwidth Management for service prioritization

IPv6

Dual-stack IPv4 and IPv6

6to4 tunneling

Stateless address auto-configuration

DHCPv6 Server for IPv6 Clients on LAN

DHCP v6 client for WAN connectivity

Internet Control Message Protocol (ICMP) v6

Static IPv6 Routing

Dynamic IPv6 Routing with RIPng

IPv6 host support

IPv6 RADIUS

Network Time Protocol (NTP)

Layer 2

802.1Q-based VLANs, 32 active VLANs plus one management VLAN

Wireless

Specifications

Description

Radio and modulation type

802.11b: direct sequence spread spectrum (DSSS), 802.11g: orthogonal frequency division multiplexing (OFDM), 802.11n: OFDM

WLAN

2.4 GHz IEEE 802.11n standard-based access point with 802.11b/g compatibility

Operating Channels

11 North America, 13 most of Europe, auto channels selection

Wireless isolation

Wireless isolation between clients

Antenna gain in dBi

2 flexible external antennas

Transmit power

802.11b: 16.5 dBm +/- 1.5 dBm; 802.11g: 15 dBm +/- 1.5 dBm; 802.11n: 12.5 dBm +/- 1.5 dBm

Receiver sensitivity

-87 dBm at 11 Mbps, -71 dBm at 54 Mbps, -68 dBm at mcs15, HT20, -66 dBm at mcs15, HT40

Radio Frequency

Single-band, works on 2.4 GHz

Wireless Domain Service (WDS)

Allows wireless signals to be repeated by up to 4 compatible devices

Operating Modes

Multifunction device-wireless router, access point mode with WDS, Point-to-Point Bridge mode with WDS, Point-Multi Point Bridge mode with WDS, Repeater mode with WDS

Active WLAN Clients

Support up to 64 concurrent clients in wireless router mode and wireless Access Point mode

Multiple SSIDs

Supports multiple Service Set Identifiers (SSIDs), up to 4 separate virtual networks

WLAN Security

Wired Equivalent Privacy (WEP), WPA, WPA2-PSK, WPA2-ENT, 802.11i

Wi-Fi Multimedia

WMM, WMM power save (WMM-PS)

Security

Specifications

Description

Access control

Yes, management access control list (ACL) plus MAC ACL

Secure management

HTTPS, username/password complexity

Firewall

Stateful packet inspection (SPI) firewall, port forwarding and triggering, Denial-of-Service (DoS) prevention, software-based DMZ

DoS attacks prevented:

- SYN Flood

- Echo Storm

- ICMP Flood

- UDP Flood

- TCP Flood

Blocks Java, cookies, active-X, HTTP proxy

Web Filter

Filters malicious and blocks harmful websites

IP Source Guard

Bind IP addresses to MAC addresses

VPN

Gateway to Gateway IPsec VPN

10 gateway-to-gateway IPsec tunnels

Client-to-Gateway IPsec

10 client-to-gateway IPsec tunnels using TheGreenBow and ShrewSoft VPN client

PPTP VPN

10 maximum tunnels

VPN Passthrough

IPSec/PPTP/Layer 2 Tunneling Protocol (L2TP) pass-through

VPN throughput (IPsec)

50 Mbps

Configuration

Specifications

Description

Web-based utility

Simple, browser-based configuration (HTTP, HTTPS)

Management protocols

Web browser, Simple Network Management Protocol (SNMP) v3, Bonjour, Universal Plug and Play (UPnP)

Remote management

Yes

Event logging

Local, remote syslog, email alerts

Network diagnostics

Local, remote syslog, email alerts

Web firmware upgrade

Firmware upgradable through web browser, imported and exported configuration file

Dynamic Host Configuration Protocol (DHCP)

DHCP Client

IPv6 host

Yes

HTTP redirect

Yes

System time

Supports NTP, daylight savings manual entry

Languages

GUI support English

Environmental

Specifications

Description

Power

12V 2.5 A

Certifications

FCC, CE, IC, Wi-Fi

Operating temperature

0° to 40°C (32° to 104°F)

Storage temperature

-20° to 70°C (-4° to 158°F)

Operating humidity

10% to 85% non-condensing