Objective

A reboot or reset turns the router off and then back on again. The configuration of some settings on the router may require a reboot to take effect. Logs stored in the volatile memory will be deleted as a consequence of a reboot. This article explains how to perform a reboot on the RV315W VPN Router via the web configuration utility.

Applicable Device

• RV315W

Software Version

• 1.01.03

Reboot Via Web Configuration Utility

Step 1. Log in to the web configuration utility and choose System Management > Reboot. The Reboot page opens:

Step 2. Click the Reboot button to reboot the system. A warning window appears.

Step 3. Click OK.

Note: This process could take several minutes. Once the reboot is complete, the Login page opens.