Table of Contents

factory reset

Device reboot

Objective

A factory reset is an entire reset on a device to factory defaults. This is useful when you want to remove an undesirable configuration that is present on the device.

Device reboot is necessary for some of the new configurations made on the web configuration utility to take effect. A reboot (or restart) of the network device is made if the device is frozen, or certain settings on the device have been changed.

This article explains how to reboot and restore factory default settings CVR100W VPN Router.

Applicable Device

• CVR100W

Software Version

• 1.0.1.19

Restore Factory Defaults and Reboot

Restore Factory Defaults

Step 1. Log in to the web configuration utility and choose Administration > Restore Factory Defaults. The Restore Factory Defaults page opens:

Step 2. Click Restore Factory Defaults to restore all the current settings to factory defaults.

Reboot

Step 1. Log in to the web configuration utility and choose Administration > Reboot. The Reboot page opens:

Step 2. Click Reboot to restart the device.