Objective

The backup of a configuration of any particular device is done to save the current settings and implement them after an upgrade. Backup configurations and settings can be restored at any time. This article explains how to backup and restore the configuration on the CVR100W VPN Router.

Applicable Device

• CVR100W

Software Version

• 1.0.0.19

Backup / Restore Configuration

Backup Configuration

Step 1. Log in to the web configuration utility and choose Administration > Backup / Restore Settings. The Backup / Restore page opens:

Step 2. To save all the current settings and configuration on the device, click Backup Configuration.

Step 3. Choose a location and save the backup configuration file to your computer.

Restore Configuration

Step 1. Log in to the web configuration utility and choose Administration > Backup / Restore Settings. The Backup / Restore page opens:

Step 2. Click Browse to find the configuration file on your computer to apply to the device.

Step 3. Click Restore Configuration to start the restore operation. After the operation, the specified configuration file is restored to the router.

Note: After you click Restore Configuration, the router reboots.