Objectives

The IPv4 LAN settings can be configured to help connect devices to the RV110W. The VLAN, IP Address, and Subnet Mask can be configured on the LAN Configuration page.

The objective of this document is to show you how to configure the IPv4 LAN Settings on the RV110W.

Applicable Devices

- RV110W

IPv4 LAN Settings

Step 1. In the web configuration utility choose Networking > LAN > LAN Configuration.

Step 2. In the VLAN drop-down menu, choose a VLAN for the IPv4 LAN.

Step 3. In the Local IP Address field, enter the LAN IP Address of the RV110W.

Step 4. In the Subnet Mask drop-down menu, choose a subnet mask for the new IP Address.

Step 5. Click Save.