Contents

Introduction

Background Information

UCSM

UCSM Managed Server/Chassis/HyperFlex Server (Includes HX, B, C, S and X Series)

UCS C-Series

New Interface

UCS S-Series

Intersight

Intersight Appliance (Connected or Private Virtual Appliance)

Related Information

Introduction

This document describes how to collect Cisco Integrated Management Controller, Unified Computing System Manager, and Intersight tech support files.

Background Information

The document describes how to create and download tech support files from Unified Computing System Manager (UCSM) for B-Series, C-Series and X-Series blade servers for release 4.0 and later (HTML Graphical User Interface), for Cisco Integrated Management Controller (CIMC) version 4.0 and later for C-Series servers and S-Series, devices managed by Intersight and for Intersight Appliance.

UCSM

From UCSM, download these types of Tech-support logs:

- UCSM creates a file that contains technical support data for the entire Cisco UCS domain. This file does not include the tech support data for chassis, fabric-extender, rack-server, and server memory.

- UCSM-MGMT creates a file that contains technical support data for the Cisco UCS management services, except for the fabric interconnects.

- Chassis creates a file that contains technical support data for either the CIMCs or I/O modules in a given chassis.

- Fabric-extender creates a file that contains technical support data for a fabric extender.

- Rack-server creates a file that contains technical support data for a C-Series server.

- Server-Memory saves a file that contains server memory technical support data for B-Series and C-Series servers to the specified directory.

- Core-Files - These files result from a UCSM or NXOS process crash. These files are needed to decode and understand what led to the process crash.

Step 1. Navigate to Admin > Faults, Events & Audit Log > TechSupport Files.

Step 2. From Options, select the technical support data to download.

Step 3. Once the Tech Support File is generated, download the file.

Step 4. Download Core files, if required.

UCSM Managed Server/Chassis/HyperFlex Server (Includes HX, B, C, S and X Series)

Step 1. Navigate to Admin > Faults, Events & Audit Log > TechSupport Files.

Step 2. In order to download tech support:

- For Chassis Tech Support (includes B-Series Server):

Under Options, select Chassis. Enter the Chassis ID to download the tech support and click OK.

- For UCSM Managed Server (includes C, S, and Hyperflex-Series):

UnderOptions,select rack-server. Enter the Rack Server ID to download the tech support and click OK.

Note: Choose option rack-server for C-series and HyperFlex Servers.

Step 3. Once a tech-support file is generated, download the file.

UCS C-Series

Step 1. Log in to CIMC and navigate to Utilities under Admin.

Step 2. Under Utilities, there are two options: Export Technical Support Data to Remote and Download Technical Support Data for Local Download.

It also shows the status of Last Technical Support Data Export.

Step 3. Click Download Technical Support Data for Local Download, select Generate and Download Technical Support Data and hit Generate and Download.

New Interface

Download the logs as shown here in the new release of UCS C-Series firmware.

Step 1.  Log in to CIMC and navigate to Administration.

Step 2. Under Utilities, navigate to Actions > Admin Utilities > Download Technical Support Data to Local File.

Step 3. Select Generate Technical Support Data. Click Generate and Download.

UCS S-Series

Step 1. Navigate to Admin > Utilities.

Step 2. Click Download Technical Support Data for Local Download, select All in Generate and Download Technical Support Data section and click Generate and Download.

Intersight

The process procedure to generate the tech support bundle for Fabric Interconnect, Chassis or Server is similar. This section is focused on the Server bundle collection.

For more details on each component, see Collect Intersight Managed UCS Tech Support Bundles Manually - Cisco

Tip: If you are in the situation where you do not have access to the  Graphical User Interface of Intersight, please consult this document to obtain the logs from the Device Console: Collect Intersight Managed Mode Device Log Bundle in Device Console - Cisco

Step 1. Navigate to Operate > Servers. Click the server from where you want to collect logs.

Step 2. Hit Actions and select Collect Tech Support Bundle

Step 3. Navigate to System > Tech Support Bundles.

Here you can see a list with all the tech support bundles generated and those in progress. Once your bundle is complete, click on the download symbol.

Intersight Appliance (Connected or Private Virtual Appliance)

Step 1. Navigate to System > Tech Support Bundles > Collect Appliance Tech Support Bundle.

Select it and wait for the collection of logs.

Step 2. Click on the download symbol once your bundle is complete.

Related Information

- Visual Guide to Collect Tech Support Files (B and C Series) (for use with older UCSM and CIMC versions)

- Collect Intersight Managed UCS Tech Support Bundles Manually - Cisco

- Collect Intersight Managed Mode Device Log Bundle in Device Console - Cisco