Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

When to Use

How to Use

Windows OS

MacOS

Understand Outputs/Checks Performed

Checks Performed by UCSM HealthCheck

Sample UCSM Tool Output Number

Analyze Tool Output - Next Steps

CLI Commands

Introduction

This document describes the process of running Unified Computing System Manager (UCSM) Health and Pre-Upgrade check tool.

Prerequisites

Requirements

Cisco recommends that you have Python 3.6 or later installed on the system.

Note: If you are running Windows OS, you can have Python installed and configured the Environment path.

Note: Do not open a TAC case for Python issues/Script failed to run. Refer the CLI commands section to manually identify the issue and open TAC case per identified issue.

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Background Information

The UCSM Check Tool is a utility to perform pro-active self-checks on UCSM to ensure its stability and resiliency. It helps automate a list of health and pre-upgrade checks on UCS systems to save time when the UCS infrastructure upgrade and maintenance operations take place.

Note: Always download and use the latest version of the tool. Since the tool is enhanced frequently, when you use an older version, it can miss important checks.

Note: This script is a best effort, free-to-use script. However, it cannot identify all issues.

When to Use

- Before UCS infrastructure upgrades

- UCS Health Check before and after Maintenance Activity

- When you work with Cisco TAC

- Proactive Health Check anytime

How to Use

Windows OS

Step 1. Download the latest version of Python from Python Downloads

Step 2. Use the normal installation process and click Install Now (the recommended one), to download the setup.

Note: Ensure to check Add Python to PATH.

Step 3. Navigate to the directory in which Python was installed on the system.

Step 4. Open the command prompt and type the command Python to verify the Python installation.

Step 5. Download the latest version of the health check script from here and save it to a folder. Now, extract the compressed file, as shown in the image.

Step 6. Download and save the latest UCSM technical support logs to the folder created, as shown in the image. Click this link to find the steps to download UCSM log bundle: Generating UCSM Technical Support.

Step 7. Open CMD and cd to the folder where UCSMTool.py is located and run UCSMTool.py as shown in the image.

Step 8. Enter the file path where the UCSM technical support file is located and choose desired option.

1. UCSM Health Check

2. PreUpgarde Check

MacOS

Step 1. MacOS comes with default Python installed. Verify the installed Python version as shown:

Note: In case the Python version is lower than 3.6, please upgrade to 3.6 and later releases.

Note: If the Python version is 3.6 or later, jump to Step 5, otherwise, jump to Step 2.

Step 2. Download the latest version of Python from Python Releases for Macros.

Step 3. Use the normal installation process to complete/upgrade the Python installation.

Step 4. Download the latest version of the health check script from here and save it to a folder. Now, extract the compressed file, as shown in this image:

Step 5. Download and save the latest UCSM technical support logs to the folder created, as shown in this image. Click the link to find the steps to download UCSM log bundle: Generating UCSM Technical Support.

Step 6. Open the terminal, browse to the directory where you have the health check script downloaded, run python UCSMTool.py or python3UCSMTool.py as shown:.

Step 7. Enter the file path where the UCSM technical support file is located, and choose desired option to run the script.

1. UCSM Health Check

2. PreUpgarde Check

Understand Outputs/Checks Performed

Checks Performed by UCSM HealthCheck

These checks are performed by UCSM-Healthchecktool:

- UCSM HA Cluster State: Displays the cluster state of fabric interconnects.

- PMON Process State: Displays the state of all processes in CiscoUCS Manager.

- File System Mount: Displays the mount table.

- Check for /var/ sysmgr size issue: Checks /var/ sysmgr usages.

- Check for /var/ tmp size issue: Checks if /var/ tmp usages.

- 6296  FI unresponsive after a power cycle, HW revision update: Verifies Fabric interconnect module and its HW revision number.

- Faults with Severity Major or Severity Critical: Reports if you have any Major or Critical Alert in UCS Manager.

- Check Backup Available: Verifies if Backup is Available in UCS Manager.

- Keyring Cert  Check: Checks if the keyring is expired or valid.

- Safeshut Workaround Needed or Not: Checks if safeshut workaround is needed or not by verifying the FI model and its version.

- Deprecated Hardware in Cisco UCS Manager Release  4.x: Checks for any deprecated Hardware in Cisco UCS Manager 4.x Release.

- Deprecated HW found for 3.1.x onwards: Checks for any deprecated Hardware in Cisco UCS Manager 3.x Release.

- Check for B200M4 reboot due to blank MRAID12G  fields: Checks if B200M4 server has a blank S/N of  MRAID12G RAID controller.

- UCSM 3.1 Change in max power allocation causes blade discovery failure: Verifies the power policy configured in the UCS Manager.

- Existence of bootflash corruption fault code F1219: Checks the existence of bootflash corruption.

- Check for httpd fail to start when the default keyring is deleted: Checks if the default keyring is deleted.

- 3rd GEN  FIs has unclean file system states-"Filesystem state: clean with errors": Checks for file system error.

- Check for Server Auto-Install to 4.0(4b) Fails to Activate  SAS Controller: Verifies the host Firmware version and the SAS Expander version.

- Check for C-Series firmware upgrade stays long in process, perform an inventory of server, PNU OS Inventory: Verifies the server Model and its version to identify if you hit this issue.

- Check UCSM Authentication Domain that uses a Period or Hyphen: Verifies if Authentication Domain name is configured with a period or hyphen characters.

- Local or fallback Authentication failure: Checks for authentication method configured for a particular FI model and verifies its version as well.

- Health check between UCSM and UCS central: Verifies if UCS Manager is registered with UCS Central.

- Reserved VLAN Check: Checks if VLANs used are from reserved VLAN range.

- LAN and  SAN Pin Groups: Checks the lan/san pinning configuration in your cluster and highlight to review your configuration before upgrade/any MW activity.

- Checking Pending Activities Present in UCSM: Verifies if there are any pending Activities in your UCS Manager Domain.

- Health Check for IOM: Checks overall health of the IO Modules.

- Core Files available in UCSM Check: Verifies if any Core File is found within 60 days.

- Disjoint L2 potential misconfiguration: Verifies if there is any misconfiguration in case Disjoint L2 is configured.

- VIC  1400 and 6400 Link Flap issue: Checks for conditions present in this defect.

- Check 2304 IOMs disconnect and re-connect during firmware update: Verifies the Fabric Interconnect and IO module model and identify if there is any potential issue.

- DME Health Check: Verifies the health of the Data Management Engine (DME) database.

- Number of Interface up and Flogi Matching on FI: Verifies number of interfaces and flogi session.

- Jumbo or Standard MTU Check: Identifies the MTU configuration.

Sample UCSM Tool Output Number

akmalla@ucsm_health_check-master % python3 UCSMTool.py

UCS Health Check Tool 2.0

Enter the UCSM file path: /Users/akmalla/Desktop/UCSM health Script/UCSMlog.tar

Press 1 for UCSM Health Check

Press 2 for PreUpgrade Check

Enter your choice (1/2): 1

Log Extraction:  [########################] COMPLETED

UCSM Version: 4.3(2c)

Summary Result:

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| SlNo | Name                                                              | Status                     | Comments                                                          |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 1    | UCSM HA Cluster State                                             | PASS                       |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 2    | PMON Process State                                                | PASS                       |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 3    | File System Mount                                                 | PASS                       |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 4    | Check for /var/sysmgr size issue                                  | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 5    | Check for /var/tmp size issue                                     | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 6    | 6296 FI unresponsive after power cycle, HW revision update        | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 7    | Faults with Severity Major or Severity Critical                   | Found                      | Review the faults and Contact TAC, if needed                      |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 8    | Check Backup Available                                            | Backup Operation Not Found | Backup operation has not been found. Please ensure that the       |

|      |                                                                   |                            | latest backup is captured as a best practice.                     |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 9    | Keyring Cert Check                                                | PASS                       |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 10   | Safeshut Workaround Needed or Not                                 | Not Needed                 |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 11   | Deprecated Hardware in Cisco UCS Manager Release 4.x              | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 12   | Deprecated HW found for 3.1.x onwards                             | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 13   | Check for B200M4 reboot due to blank MRAID12G fields              | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 14   | UCSM 3.1 Change in max power allocation causes blade discovery    | Not Found                  |                                                                   |

|      | failure                                                           |                            |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 15   | Existence of bootflash corruption fault code F1219                | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 16   | Check for httpd fail to start when default keyring is deleted     | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 17   | 3rd GEN FIs has unclean file system states-"Filesystem state:     | Not Found                  |                                                                   |

|      | clean with errors"                                                |                            |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 18   | Check for Server Auto-Install to 4.0(4b) Fails to Activate SAS    | Not Found                  |                                                                   |

|      | Controller                                                        |                            |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 19   | Check for C-Series firmware upgrade stays long in process         | Not Found                  |                                                                   |

|      | "perform inventory of server"  PNU OS Inventory                   |                            |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 20   | Check UCSM Authentication Domain using a Period or Hyphen         | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 21   | Local or fallback Authentication failure                          | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 22   | Health check between UCSM and UCS central                         | Not Found                  | UCS Manager is Not Registered                                     |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 23   | Reserved VLAN Check                                               | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 24   | LAN and SAN Pin Groups                                            | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 25   | Checking Pending Activities Present in UCSM                       | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 26   | Health Check for IOM                                              | PASS                       |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 27   | Core Files available in UCSM Check                                | Not Found                  | No core files were found in last 60 days                          |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 28   | Disjoint L2 potential misconfiguration                            | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 29   | VIC 1400 and 6400 Link Flap Issue                                 | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 30   | Check 2304 IOMs disconnect and re-connect during firmware update  | Not Found                  |                                                                   |

|      | step                                                              |                            |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 31   | Number of Interface up and Flogi Matching on FI                   | ---                        | Primary:                                                          |

|      |                                                                   |                            |   FC Port Trunking Count: 0,                                      |

|      |                                                                   |                            |   Eth up Port: 7,                                                 |

|      |                                                                   |                            |   Flogi Count: 0                                                  |

|      |                                                                   |                            | Secondary:                                                        |

|      |                                                                   |                            |   FC Port Trunking Count: 0,                                      |

|      |                                                                   |                            |   Eth up Port: 7,                                                 |

|      |                                                                   |                            |   Flogi Count: 0                                                  |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

| 32   | Jumbo or Standard MTU Check                                       | Not Found                  |                                                                   |

+------+-------------------------------------------------------------------+----------------------------+-------------------------------------------------------------------+

Faults with Severity Major:

F0331: Service profile DemoSP cannot be accessed

F0831: lan Member 1/2 of Port-Channel XXXX on fabric interconnect B is down, membership: down

F0858: lan port-channel XXXX on fabric interconnect B oper state: failed, reason: port-channel-members-down

F0831: lan Member 1/2 of Port-Channel XXXX on fabric interconnect A is down, membership: down

F0858: lan port-channel XXXX on fabric interconnect A oper state: failed, reason: port-channel-members-down

NOTE:

a. All reports and logs will be saved in the same location from where the script was executed.

b. Please visit the Summary Report/ Main Report to view all the Major and Critical Fault alerts.

Analyze Tool Output - Next Steps

- The tool automates the process of running manual commands on UCS Systems.

- If the tool runs OK and gives PASS/NOT FOUND on all tests. The UCS system is good for all the checks which the script has performed.

- In situations where the tool FAIL/FOUND on some checks or does not run successfully, you can use the CLI commands (listed here) to perform the same checks on UCS System/Fabric interconnect as done by the script Manually.

- The tool DOES NOT check for any old/new/open/resolved caveats and hence it is highly recommended to review UCS Release Notes and Upgrade Guides before any upgrade or maintenance activity.

Tip: For a general health check of your UCS environment, Cisco TAC does not provide this service. Cisco's CX Customer Delivery Team (formerly known as Advanced Services) does have a bug scrub/risk analysis it offers. If you require this type of service, contact your Sales/Account Team.

CLI Commands

SSH to both Fabric Interconnects:

# show cluster extended-state, verify HA status is ready.

# connect local-mgmt ; # show pmon state, Verify the services are in running status.

# connect nxos ; # show system internal flash, Verify free size in  /var/sysmgr and /var/tmp

# connect nxos ; # show module, verify HW revision number for 6296 fabric interconnects.

# show fault detail | include F1219, verify this fault code for bootflash corruption

# scope eth-uplink; # show reserved-vlan

# show iom health status, displays health of IOM

# show server status, verify the status of server.

# scope monitoring; # scope sysdebug; # show cores , verify if there are any core files.

# scope security; # scope keyring default; #show detail, verify details for default keyring, expiry etc.

# connect nxos; # show int br | grep -v down | wc –l, verify the number of active Ethernet interfaces.

# scope security; # show authentication, review the authentication type.

# connect nxos; # show flogi database, review the flogi database.