Contents

Introduction

Prerequisites

Requirements

Components Used

Configuration

1. UCS Central Roles

Step 1.1 Create UCS Central Users Administration Role

Step 1.2 Configure Local User

2. UCS Domain Roles

Step 2.1 Create a role in UCSM Domain.

3. Validate KVM access to UCSM Domain

Step 3.1 Launch KVM from UCS Central

LDAP Authentication

Related Information

Introduction

This document describes how to configure roles in UCS Central and UCSM in order to allow KVM access to an UCS domain that is launched via UCS Central.

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- Unified Compute System (UCS)

- UCS Central

Components Used

The information in this document is based on these software and hardware versions:

- UCS-FI-6248UP, Firmware 4.0(1c)

- UCS Central, Firmware 2.0(1p)

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Configuration

1. UCS Central Roles

Step 1.1 Create UCS Central Users Administration Role

- In UCS Central, Navigate to System Configuration Button >  User Settings and select Roles.

- Create a new role named 'ucs-kvm'

- For the newly created role 'ucs-kvm' Under Operations tab add the KVM Privilege

Role configuration on UCS Central

Step 1.2 Configure Local User

- Navigate to System Configuration Button >  User Settings and select  Local User.

- Select the corresponding user and then under  Roles  tab add the next 3 roles for the select user:

1. Administrators

2. Read-Only

3. ucs-kvm (same role created in previous step)

Local Users configuration

Role assignment for Local Users in UCS Central

2. UCS Domain Roles

Step 2.1 Create a role in UCSM Domain.

On each UCSM Domain that is desired to access via KVM from Central perform these steps:

- Navigate to  All  >  User Management  >  User Services  >  Roles and click  Add.

- Create the role  ucs-kvm  and select only the  Service Profile Ext Access  privilege.

New Role creation on UCS Manager

3. Validate KVM access to UCSM Domain

Step 3.1 Launch KVM from UCS Central

- Log into UCS Central with the corresponding credentials of local user in Step 1.2

- Navigate to the  System tools  button > Unified KVM Launcher

- Mark the check box of a domain where a role has been already created as described in Step 2.1 and KVM must work now.

Launching KVM from selected UCS Domain from UCS Central

LDAP Authentication

Note: If LDAP authentication is use this instructions instead of Local User method.

- Navigate to  System Configuration Button >  User Settings  and select Authentication  and assign the same 3 Roles for the desired  Group Maps  option as in step 1.2 under the LDAP Section

Role assignment for LDAP group in UCS Central

Related Information

- Users and Roles in UCS Central

- Cisco Technical Support & Downloads