Contents

Introduction

Prerequisites

Requirements

Components Used

Configuration Steps

Reporting and Logs

Logs

Reporting

Related Information

Introduction

This document describes the process of blocking upload traffic to certain websites in the Secure Web Appliance (SWA).

Prerequisites

Requirements

Cisco recommends knowledge of these topics:

- Access ToGraphic User Interface (GUI)of SWA

- Administrative Access to the SWA.

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Configuration Steps

Step 1. Create a Custom URL Category for the website.

Step 1.1. From the GUI Navigate to Web Security Manager and choose Custom and External URL Categories.

Step 1.2. Click Add Category to create a new Custom URL Category.

Step 1.3. Enter Name for the new category.

Step 1.4. Define the domain and/or subdomains of the website that you are trying to block upload traffic (In this example is cisco.com and all its subdomains).

Step 1.5.Submit the changes.

Image - Create Custom URL Category

Tip: For more information about how to configure Custom URL Categories, kindly visit: https://www.cisco.com/c/en/us/support/docs/security/secure-web-appliance-virtual/220557-configure-custom-url-categories-in-secur.html

Step 2. Decrypt the traffic for the URL

Step 2.1. From the GUI, Navigate to Web Security Manager and choose Decryption Policies

Step 2.2. Click Add Policy.

Step 2.3. Enter Name for the new policy.

Step 2.4. (Optional) Select the Identification Profile that you need this policy applies to.

Step 2.5. From Policy Member Definition section, Click  URL Categories links to add the Custom URL Category.

Step 2.6. Select the URL Category that was created in Step 1.

Step 2.7. Click Submit.

Image - Create a Decryption Policy

Step 2.8. In Decryption Policies page, click the link from URL Filtering for the new policy.

Image - Select the URL Filtering

Step 2.9. Choose Decrypt as the action for Custom URL Category.

Step 2.10. Click Submit.

Image - Set Decrypt as Action

Step 3. Block the Upload Traffic

Step 3.1. From the GUI, Navigate to Web Security Manager and choose Cisco Data Security.

Step 3.2. Click Add Policy.

Step 3.3. Enter Name for the new policy.

Step 3.4. (Optional) Select the Identification Profile that you need this policy applies to.

Step 3.5. From Policy Member Definition section, Click URL Categories links to add the Custom URL Category.

Step 3.6. Select the URL Category that was created in Step 1.

Step 3.7. Click Submit.

Image - Cisco Data Security Policy

Tip: For the reporting purpose, It is best to choose a name that is not same as any other Access/Decryption Policies.

Step 3.8. In Cisco Date Security Policy page, click the link from URL Filtering for the new policy.

Image - Select the URL Filtering

Step 3.9. Choose Block as the action for Custom URL Category.

Step 3.10. Click Submit.

Image - Block Upload

Step 3.11. Commit changes.

Reporting and Logs

Logs

You can view the logs related to the upload traffic from CLI by choosing idsdataloss_logs which is the default logging name for Data Security Logs.

Use these steps to access the logs:

Step 1. Log in to the CLI

Step 2. Type grep and press Enter.

Step 3. Find and type the number associated with idsdataloss_logs:

- Type: "Data Security Logs"

- Retrieval: FTP Poll and press Enter.

Step 4. (Optional)  Enter the regular expression to grep you fan filter by keywords, or you can press Enter, to view all the logs

Step 5. (Optional)  Do you want this search to be case insensitive? [Y]> If you select any keywords in the Step 4 you can choose the filter be case insensitive or not.

Step 6. (Optional) Do you want to search for non-matching lines? [N]> In case you need to filter all the logs except the selected keywords defined in Step 4 you can use this section, else, you can press Enter.

Step 7. (Optional) Do you want to tail the logs? [N]> If you need to view the live logs, type Y and press Enter. Otherwise, press Enter to display all the available logs.

Step 8. (Optional) Do you want to paginate the output? [N]> If you need to see the results per page, you can type Y and press Enter, else pres Enter to use the default value [N].

Reporting

You can generate Web Tracking report to view the reports of the blocked upload traffic by the Cisco Data Security policy name.

Use these steps to generate the reports:

Step 1. From the GUI, select Reporting and choose Web Tracking.

Step 2. Choose your desired Time Range.

Step 3. Click  the Advanced link to search transactions using advanced criteria.

Step 4. In the Policy section, select Filter by Policy and type the name of the Cisco Data Security that was created previously.

Step 5. Click Search to review the report.

Image - Filtering the Web Tracking Reports

Related Information

- User Guide for AsyncOS 15.2 for Cisco Secure Web Appliance

- Cisco Secure Email and Web Virtual Appliance Installation Guide

- Configure Custom URL Categories in Secure Web Appliance - Cisco

- Use Secure Web Appliance Best Practices

- Configure Firewall for Secure Web Appliance

- Configure Decryption Certificate in Secure Web Appliance

- Configure and Troubleshoot SNMP in SWA

- Configure SCP Push Logs in Secure Web Appliance with Microsoft Server

- Enable Specific YouTube Channel/Video and Block Rest of YouTube in SWA

- Understand HTTPS Accesslog Format in Secure Web Appliance

- Access Secure Web Appliance Logs

- Bypass Authentication in Secure Web Appliance

- Block Traffic in Secure Web Appliance

- Bypass Microsoft Updates Traffic in Secure Web Appliance