Contents

Introduction

Overview

Solution

Introduction

This document describes how to enable reporting for Cloud-Delivered Firewall policies on network tunnels.

Overview

By default, reporting for Umbrella Cloud-Delivered Firewall is not enabled. You must manually enable the feature on each network tunnel to receive reports for Cloud-Delivered Firewall policies.

Solution

To enable reporting on the Dashboard:

1. Navigate to Policies > Firewall.

2. Select the network tunnel to enable reporting.

3. Click the three dots on the right-hand side of the selected tunnel.

4. Toggle the switch for Logging to enable reporting.

360055369031

5. Toggle the switch for Logging to enable.

360055232232