Contents

Introduction

Overview

Introduction

This document describes Umbrella legacy APIs and Cisco integrations.

Overview

After their End Of Life, the Umbrella Legacy APIs remain supported only for Cisco integrations which haven’t been migrated to the Umbrella API yet.

Here is a list of hardware integrations that remain supported:

Integration

Umbrella DNS

Umbrella SIG Tunnels

Cisco Catalyst SD-WAN

•

•

Cisco Catalyst Wireless

•

Cisco Catalyst Switches

•

• (with Cisco DNA Centre)

Meraki MX

•

Meraki MR

•

Meraki Umbrella SD-WAN Connector (Meraki MX)

•

•

Cisco+ Secure Connect

•

•

Cisco DNA Center / Catalyst Center

•

•

Cisco ASA

•

Cisco FMC

•

•

Cisco FTD

•

Cisco ISR

•

Apart from these hardware integrations, the Umbrella Legacy APIs remain supported for the integrations with these platforms:

- Cisco SecureX

- Cisco XDR

If you have questions or need help with your Cisco integrations with Umbrella, please contact Umbrella Support at umbrella-support@cisco.com.