Contents

Introduction

Prerequisites

Requirements

Components Used

Problem

Solution

Cause

Additional Information

Introduction

This document describes troubleshooting "Access Denied" when the Cisco Umbrella Active Directory (AD) Connector is in Alert or Error states.

Prerequisites

Requirements

There are no specific requirements for this document.

Components Used

The information in this document is based on Cisco Umbrella.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Problem

You notice that an AD Connector is showing alert or error state, and the message listed when you hover over the alert include "Access Denied" to one of the registered AD servers.

Solution

Please ensure that the OpenDNS_Connector user is a member of these AD Groups:

- Event Log Readers

- Distributed COM users

- Enterprise Read-only Domain Controllers

The solution is to make sure DCOM, WMI and Manage Audit and Security Log are setup correctly on the AD server in question.

Note: Multiple domains or multiple forests are not supported by default. Please refer to the article on Multi-AD Domain Support in Umbrella. You can also contact Umbrella Support about your configuration to get assistance if you run into these issues.

To verify WMI Permissions:

1. Select Start > Run > wmimgmt.msc to access the Windows Management Infrastructure Control console.

2. Right-click WMI Control > Properties > Security tab.

3. Select Root > CIMV2 namespace and select the Security button.

4. Add the OpenDNS_Connector user and Allow these permissions:

- Enable Account

- Remote Enable

- Read Security

To verify DCOM Permissions:

1. From a command line, run dcomcnfg.

2. Navigate to Console Root > Component Services > Computers.

3. Right-click on My Computer and select Properties.

4. From My Computer Properties, select the COM Security tab.

5. In the Launch and Activation Permissions section, select Edit Limits.

6. Add the OpenDNS_Connector user and allow Remote Launch and Remote Activation permissions.

7. Select OK to confirm and close My Computer Properties.

Note: In most cases, if DCOM changes are made, a reboot of that DC is required for the changes to take effect.

To verify "Manage Audit and Security Logs" on Windows 2003 servers:

1. On a Domain Controller, open a command prompt and type this command (if you are running Windows 2003, replace /r with /v):

gpresult /scope computer /r

2. Look for the Applied Group Policy Objects line. Under it is a list of policies applied to that Domain Controller. Make note of one that can  be applied to all Domain Controllers.

(like "Default Domain Controllers Policy"). If none exist, you need to create one and apply it.

To edit the proper policy:

3. Open the Group Policy Management panel (via Start/Administrative Tools). Select the desired policy. Something in the "Domain Controllers" folder is a likely candidate.

4. Right-click that policy and select Edit to bring up the Group Policy Management Editor.

5. Browse to the Computer Configuration\Policies\Windows Settings\Security Settings\Local Policies\User Rights Assignment folder and select Manage audit and security log to view its properties.

6. Select Define these policy settings >Add user or group. Browse and select the OpenDNS_Connector user.

7. Run the "gpupdate /force" command on the Domain Controller to make sure the policy is applied.

Cause

This error usually indicates the OpenDNS_Connector user has insufficient permissions to operate.

The Windows Connector script normally sets the required permissions for the OpenDNS_Connector user. However, in strict AD environments, some administrators are not permitted to run VB scripts on their Domain Controllers, and thus needs to manually replicate the actions of the Windows Configuration script.

Additional Information

For the more information about resolving this issue please visit Complete Topics for Access Denied Resolution.

If after confirming/changing the aforementioned settings, you are still seeing "Access Denied" messages in the Dashboard, please send Support the Connector logs as outlined in this article: Provide Support with AD Connector Logs.