Contents

Introduction

Information

Introduction

Starting October 22nd, 2021, Umbrella customers can now connect to our newest edge data center in Querétaro, Mexico for full SIG services, including DNS, Secure Web Gateway, and Cloud Delivered Firewall.

Information

A new region was created for IPsec tunnel connections: LA-1. The initial members of this region are Querétaro and Miami, Florida. Miami will be replaced by a second Latin America DC in the future with its own IP address. Customers can use Atlanta for automatic failover, or manually configure another data center for backup tunnels.

This new edge data center expandsour rapidly growingglobal network. Due to our innovativeglobal cloud architectureandanycastrouting, most customers in the region will automatically connect to this new data center.

Also, while we strive to maintain high uptime for all of our data centers,ouraugmented routingsolution seamlessly and automatically routes traffic to the next nearest data centerif for any reason a data center is unavailable.