Contents

Introduction

Secure Malware Analytics Clouds

US (United States) Cloud

EU (Europe) Cloud

CA (Canada) Cloud

AU (Australia) Cloud

Secure Malware Analytics Appliance

Dirty Interface

Remote Network Exit

Clean Interface

Admin Interface

Introduction

This document outlines the essential network configurations you need to implement on your firewall to ensure seamless operation of Secure Malware Analytics.

Contributed by Cisco TAC Engineers.

Secure Malware Analytics Clouds

US (United States) Cloud

Access URL: https://panacea.threatgrid.com)

Hostname

IP

Port

Details

panacea.threatgrid.com

63.97.201.67, 63.162.55.67

443

For Secure Malware Analytics Portal and Integrated Devices (ESA/WSA/FTD/ODNS/Meraki)

glovebox.chi.threatgrid.com

200.194.241.35

443

Sample Interaction window

glovebox.rcn.threatgrid.com

63.97.201.67

443

Sample Interaction window

glovebox.scl.threatgrid.com

63.162.55.67

443

Sample Interaction window

fmc.api.threatgrid.com

63.97.201.67, 63.162.55.67

443

FMC/FTD  File Analysis Service

EU (Europe) Cloud

Access URL: https://panacea.threatgrid.eu

Hostname

IP

Port

Details

panacea.threatgrid.eu

62.67.214.195, 200.194.242.35

443

For Secure Malware Analytics Portal and Integrated Devices (ESA/WSA/FTD/ODNS/Meraki)

glovebox.muc.threatgrid.eu

62.67.214.195

443

Sample Interaction window

glovebox.fam.threatgrid.eu

200.194.242.35

443

Sample Interaction window

fmc.api.threatgrid.eu

62.67.214.195, 200.194.242.35

443

FMC/FTD  File Analysis Service

Old IP 89.167.128.132 has been retired, please update your firewall rules with above IPs.

CA (Canada) Cloud

Access URL:https://panacea.threatgrid.ca

Hostname

IP

Port

Details

panacea.threatgrid.ca

200.194.240.35

443

For Secure Malware Analytics Portal and Integrated Devices (ESA/WSA/FTD/ODNS/Meraki)

glovebox.kam.threatgrid.ca

200.194.240.35

443

Sample Interaction window

fmc.api.threatgrid.ca

200.194.240.35

443

FMC/FTD  File Analysis Service

AU (Australia) Cloud

Access URL:https://panacea.threatgrid.au

Hostname

IP

Port

Details

panacea.threatgrid.com.au

124.19.22.171

443

For Secure Malware Analytics Portal and Integrated Devices (ESA/WSA/FTD/ODNS/Meraki)

glovebox.syd.threatgrid.com.au

124.19.22.171

443

Sample Interaction window

fmc.api.threatgrid.com.au

124.19.22.171

443

FMC/FTD  File Analysis Service

Secure Malware Analytics Appliance

The following are the recommended firewall rules per interface of the Secure Malware Analytics Appliance.

Dirty Interface

Used by VMs to communicate with the internet so that samples can resolve DNS and communicate with command and control (C&C) servers

Allow:

Direction

Protocol

Port

Destination

Hostname

Details

Outbound

IP

ANY

ANY

Recommended except where specified in the Deny section here.

Used to allow connectivity for analysis.

Outbound

TCP

22

54.173.231.161 1

63.97.201.98 2 63.162.55.98 2

support-snapshots.threatgrid.com

Used for automatic support diagnostic uploads

Note: Requires software version 1.2+

Outbound

TCP

22

54.173.181.217 1 , 54.173.182.46 1

63.162.55.97 2 63.97.201.97 2

appliance-updates.threatgrid.com

Appliance Updates

Outbound

TCP

19791

54.164.165.137 1, 34.199.44.202 1

63.97.201.96 2 , 63.162.55.96 2

rash.threatgrid.com

Remote Support / Appliance Support Mode

Outbound

TCP

22

63.97.201.99

63.162.55.99

appliance-licensing.threatgrid.com

License Management

1These IPs will be disabled in the near future.

2These are the IPs that would replace the ones in 1. We suggest adding both IPs until the communication about the IP changes is made in the near future.

Remote Network Exit

Used by the appliance to tunnel VM traffic to a remote exit formerly known as tg-tunnel.

Direction

Protocol

Port

Destination

Outbound

TCP

21413

163.182.175.193

Outbound

TCP

21417

69.55.5.250

Outbound

TCP

21415

69.55.5.250

Outbound

TCP

21413

76.8.60.91

Note: Remote Exit  4.14.36.142 has been removed and is no longer in production. Ensure to have all IPs mentioned added to your firewall exception list.

Deny:

Direction

Protocol

Port(s)

Destination

Details

Outbound

SMTP

ANY

ANY

To prevent malware from sending out spam.

Inbound

IP

ANY

Secure Malware Analytics Appliance Dirty Interface

Recommended except where specified in the Allow section above.

Used to allow communication for analysis.

Clean Interface

Used by various connected services to submit samples as well as UI access for analysts.

Allow:

Direction

Protocol

Port(s)

Destination

Details

Inbound

TCP

443 and 8443

Secure Malware Analytics Appliance Clean Interface

WebUI and API access

Inbound

TCP

9443

Secure Malware Analytics Appliance Clean Interface

Used for Glovebox

Inbound

TCP

22

Secure Malware Analytics Appliance Clean Interface

Admin TUI access over SSH

Outbound

TCP

19791

Host: rash.threatgrid.com

54.164.165.137 1 ,34.199.44.202 1

63.97.201.96 2 ,63.162.55.96 2

Recovery Mode for Secure Malware Analytics Support.

1These IPs will be disabled in the near future.

2These are the IPs that would replace the ones in 1. We suggest adding both IPs until the communication about the IP changes is made in the near future.

Admin Interface

Access to the administration UI.

Allow:

Direction

Protocol

Port(s)

Destination

Details

Inbound

TCP

443 and 8443

Secure Malware Analytics Appliance Admin Interface

Used to configure settings for hardware and licensing.

Inboud

TCP

22

Secure Malware Analytics Appliance Admin Interface

Admin TUI access over SSH