Contents

Introduction

Prerequisites

Requirements

Components Used

Required Server Addresses for Proper Cisco Secure Endpoint Operations

Server Locations

North America

Europe

Asia Pacific, Japan, China

Required Server Addresses for Proper Cisco Secure Malware Analytics Cloud Access

Required Server Addresses for Proper Orbital Use

North America Cloud (NAM) Cloud

European (EU) Cloud

Asia Pacific, Japan, China (APJC) Cloud

Static IP Addresses

Introduction

This document describes the servers that are required in order to enable the Cisco Secure Endpoint (formerly Cisco AMP) product and Cisco Secure Malware Analytics (formerly Threat Grid) product to communicate and complete updates, lookups, and reports. In order to complete the operations successfully, your firewall must allow connectivity from the Connector/Appliance to the required servers.

Caution: All of the servers use a round-robin IP address schema for load balancing, fault tolerance, and uptime. Therefore, the IP addresses might change, and Cisco recommends that the firewall be configured with CNAME instead of an IP address.

Caution: Any traffic coming towards Cisco servers cannot be subjected to the TLS decryption.

Prerequisites

Requirements

This Tech Zone article applies to the following Cisco Products integrating with Cisco Secure Endpoint (AMP) product and Malware Analytics(Threat Grid):

- Cisco Secure Endpoints for Networks (Firepower Management Center and Sensors)

- Cisco Secure Endpoint Private Cloud

- Cisco Secure Endpoint Public Cloud

- Cisco Secure Email Appliance and Cisco Email Security (ESA and CES)

- Cisco Secure Web Appliance (WSA)

- Cisco Secure Malware Analytics Cloud and/or Appliance (Threat Grid)

- SDWAN/IOS-XE

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Required Server Addresses for Proper Cisco Secure Endpoint Operations

Server Locations

The Cisco Secure Endpoint and Cisco Secure Malware Analytics servers are located in three different locations:

- North America (Cisco Secure Endpoint and Cisco Secure Malware Analytics)

- Europe (Cisco Secure Endpoint and Cisco Secure Malware Analytics)

- Japan (Cisco Secure Endpoint only)

North America

This table lists the server locations for North America. Based on the account creation date, the server addresses might be different:

Category

Purpose

Server

Port

Cisco Secure Endpoint: Public Cloud

Disposition Server

cloud-ec-asn.amp.cisco.com

cloud-ec-est.amp.cisco.com

enrolment.amp.cisco.com

TCP 443

Console

console.amp.cisco.com

TCP 443

Management Server

mgmt.amp.cisco.com

TCP 443

Event Server

intake.amp.cisco.com

TCP 443

Policies

policy.amp.cisco.com

TCP 443

Connector Downloads and Updates

upgrades.amp.cisco.com

TCP 80 and 443

Error Reporting

crash.amp.cisco.com

TCP 443

Endpoint IOCs

ioc.amp.cisco.com

TCP 443

TETRA Update Server

tetra-defs.amp.cisco.com

commercial.ocsp.identrust.com

validation.identrust.com

TCP 80 and 443

macOS and Linux Clam Definitions

clam-defs.amp.cisco.com

TCP 80 and 443

Advanced Custom Detections

custom-signatures.amp.cisco.com

TCP 443

Remote File Fetch

rff.amp.cisco.com

submit.amp.cisco.com

TCP 443

TETRA

nimbus.bitdefender.net

TCP 443

Behavior Protection

apde.amp.cisco.com

TCP 443

Device Control

endpoints.amp.cisco.com

TCP 443

Android Connector

Disposition Server

cloud-android-asn.amp.cisco.com

TCP 443

CSC/iOS Connector

Disposition Server

cloud-ios-asn.amp.cisco.com

cloud-ios-est.amp.cisco.com

TCP 443

Cisco Secure Endpoint: Private Cloud

Upstream Disposition Server <v2.4

cloud-pc-est.amp.cisco.com

cloud-pc-asn.amp.cisco.com

TCP 443

Upstream Disposition Server >v2.4

cloud-pc-est.amp.cisco.com

cloud-pc-asn.amp.cisco.com

TCP 443

Yum Server

packages-v2.amp.sourcefire.com

pc-packages.amp.cisco.com

TCP 443

TCP 443

Support Session

support-sessions.amp.cisco.com

TCP 22

Secure Firewall (AMP For Networks)

Disposition Server (from FMC, or from sensor if FDM managed)

6.0 - 6.2: cloud-sa.amp.sourcefire.com

6.3 - 7.6: cloud-sa.amp.cisco.com

7.7+: cloud-ngfw-asn.amp.cisco.com AND cloud-ngfw-est.amp.cisco.com

TCP 443

Event ingestion (from FMC)

7.7+: intake.amp.cisco.com

TCP 443

Console registration (from FMC)

7.7+: mgmt.amp.cisco.com

TCP 443

Event delivery (from FMC)

6.0 - 6.2: export.amp.sourcefire.com

6.3+: export.amp.cisco.com

TCP 443

API (from FMC)

6.0 - 6.2: api.amp.sourcefire.com

6.3+: api.amp.cisco.com AND api.amp.sourcefire.com

TCP 443

Secure Email Gateway (ESA)

Secure Web Appliance (WSA)

Secure Email and Web Manager

(SMA)

File Reputation (ESA/WSA)

>= 15.x: cloud-esa-asn.amp.cisco.com

cloud-esa-est.amp.cisco.com

< 15.x: cloud-sa.amp.cisco.com

TCP 443

API (ESA)

>= 15.x: api.amp.cisco.com

< 15.x: N/A

TCP 443

Event Server (ESA)

>= 15.x: intake.amp.cisco.com

< 15.x: N/A

TCP 443

Management Server (ESA)

>= 15.x: mgmt.amp.cisco.com

< 15.x: N/A

TCP 443

Meraki MX

Disposition Server

cloud-meraki-asn.amp.cisco.com

cloud-meraki-est.amp.cisco.com

TCP 443

SDWAN

Disposition Server

cloud-isr-asn.amp.cisco.com

cloud-isr-est.amp.cisco.com

TCP 443

Europe

This table lists the server locations for Europe. Based on the account creation date, the server addresses might be different:

Category

Purpose

Server

Port

Cisco Secure Endpoint: Public Cloud

Disposition Server

cloud-ec-asn.eu.amp.cisco.com

cloud-ec-est.eu.amp.cisco.com

enrolment.eu.amp.cisco.com

TCP 443

Console

console.eu.amp.cisco.com

TCP 443

Management Server

mgmt.eu.amp.cisco.com

TCP 443

Event Server

intake.eu.amp.cisco.com

TCP 443

Policies

policy.eu.amp.cisco.com

TCP 443

Connector Downloads and Updates

upgrades.eu.amp.cisco.com

TCP 80 and 443

Error Reporting

crash.eu.amp.cisco.com

TCP 443

Endpoint IOCs

ioc.eu.amp.cisco.com

TCP 443

TETRA Update Server

tetra-defs.eu.amp.cisco.com

commercial.ocsp.identrust.com

validation.identrust.com

TCP 80 and 443

macOS and Linux Clam Definitions

clam-defs.eu.amp.cisco.com

TCP 80 and 443

Advanced Custom Detections

custom-signatures.eu.amp.cisco.com

TCP 443

Remote File Fetch

rff.eu.amp.cisco.com

submit.amp.cisco.com

TCP 443

TETRA

nimbus.bitdefender.net

TCP 443

Behavior Protection

apde.eu.amp.cisco.com

TCP 443

Device Control

endpoints.eu.amp.cisco.com

TCP 443

Android Connector

Disposition Server

cloud-android-asn.eu.amp.cisco.com

TCP 443

CSC/iOS Connector

Disposition Server

cloud-ios-asn.eu.amp.cisco.com

cloud-ios-est.eu.amp.cisco.com

TCP 443

Cisco Secure Endpoint: Private Cloud

Upstream Disposition Server <v2.4

cloud-pc-est.eu.amp.cisco.com

cloud-pc-asn.eu.amp.cisco.com

TCP 443

Upstream Disposition Server >v2.4

cloud-pc-est.eu.amp.cisco.com

cloud-pc-asn.eu.amp.cisco.com

TCP 443

Yum Server

packages-v2.amp.sourcefire.com

pc-packages.amp.cisco.com

TCP 443

TCP 443

Support Session

support-sessions.amp.cisco.com

TCP 22

Secure Firewall (AMP For Networks)

Disposition Server (from FMC, or from sensor if FDM managed)

6.0 - 6.2: cloud-sa.eu.amp.sourcefire.com

6.3 - 7.6: cloud-sa.eu.amp.cisco.com

7.7+: cloud-ngfw-asn.eu.amp.cisco.com AND cloud-ngfw-est.eu.amp.cisco.com

TCP 443

Event ingestion (from FMC)

7.7+: intake.eu.amp.cisco.com

TCP 443

Console registration (from FMC)

7.7+: mgmt.eu.amp.cisco.com

TCP 443

Event delivery (from FMC)

6.0 - 6.2: export.eu.amp.sourcefire.com

6.3+: export.eu.amp.cisco.com

TCP 443

API (from FMC)

6.0 - 6.2: api.eu.amp.sourcefire.com

6.3+: api.eu.amp.cisco.com AND api.eu.amp.sourcefire.com

TCP 443

Secure Email Gateway (ESA)

Secure Web Appliance (WSA)

Secure Email and Web Manager

(SMA)

File Reputation (ESA/WSA)

>= 15.x: cloud-esa-asn.eu.amp.cisco.com

cloud-esa-est.eu.amp.cisco.com

< 15.x: cloud-sa.eu.amp.cisco.com

TCP 443

API (ESA)

>= 15.x: api.eu.amp.cisco.com

< 15.x: N/A

TCP 443

Event Server (ESA)

>= 15.x: intake.eu.amp.cisco.com

< 15.x: N/A

TCP 443

Management Server (ESA)

>= 15.x: mgmt.eu.amp.cisco.com

< 15.x: N/A

TCP 443

SDWAN

Disposition Server

cloud-isr-asn.eu.amp.cisco.com

cloud-isr-est.eu.amp.cisco.com

TCP 443

Asia Pacific, Japan, China

This table lists the server locations for the Asia Pacific, Japan, and China:

Category

Purpose

Server

Port

Cisco Secure Endpoint: Public Cloud

Disposition Server

cloud-ec-asn.apjc.amp.cisco.com

cloud-ec-est.apjc.amp.cisco.com

enrolment.apjc.amp.cisco.com

TCP 443

Console

console.apjc.amp.cisco.com

TCP 443

Management Server

mgmt.apjc.amp.cisco.com

TCP 443

Event Server

intake.apjc.amp.cisco.com

TCP 443

Policies

policy.apjc.amp.cisco.com

TCP 443

Connector Downloads and Updates

upgrades.apjc.amp.cisco.com

TCP 80 and 443

Error Reporting

crash.apjc.amp.cisco.com

TCP 443

Endpoint IOCs

ioc.apjc.amp.cisco.com

TCP 443

TETRA Update Server

tetra-defs.apjc.amp.cisco.com

commercial.ocsp.identrust.com

validation.identrust.com

TCP 80 and 443

macOS and Linux Clam Definitions

clam-defs.apjc.amp.cisco.com

TCP 80 and 443

Advanced Custom Detections

custom-signatures.apjc.amp.cisco.com

TCP 443

Remote File Fetch

rff.apjc.amp.cisco.com

submit.amp.cisco.com

TCP 443

TETRA

nimbus.bitdefender.net

TCP 443

Behavior Protection

apde.apjc.amp.cisco.com

TCP 443

Device Control

endpoints.apjc.amp.cisco.com

TCP 443

Android Connector

Disposition Server

cloud-android-asn.apjc.amp.cisco.com

TCP 443

CSC/iOS Connector

Disposition Server

cloud-ios-asn.apjc.amp.cisco.com

cloud-ios-est.apjc.amp.cisco.com

TCP 443

Cisco Secure Endpoint:

Private Cloud

Upstream Disposition Server < v2.4

cloud-pc-est.amp.cisco.com

cloud-pc-asn.amp.cisco.com

TCP 443

Upstream Disposition Server > v2.4

cloud-pc-est.amp.cisco.com

cloud-pc-asn.amp.cisco.com

TCP 443

Yum Server

packages-v2.amp.sourcefire.com

pc-packages.amp.cisco.com

TCP 443

TCP 443

TCP 443

Support Session

support-sessions.amp.cisco.com

TCP 22

Secure Firewall (AMP For Networks)

Disposition Server (from FMC, or from sensor if FDM managed)

6.0 - 6.2: cloud-sa.apjc.amp.sourcefire.com

6.3 - 7.6: cloud-sa.apjc.amp.cisco.com

7.7+: cloud-ngfw-asn.apjc.amp.cisco.com AND cloud-ngfw-est.apjc.amp.cisco.com

TCP 443

Event delivery (from FMC)

6.0 - 6.2: export.eu.amp.sourcefire.com

6.3+: export.eu.amp.cisco.com

TCP 443

Event ingestion (from FMC)

7.7+: intake.apjc.amp.cisco.com

TCP 443

Console registration (from FMC)

7.7+: mgmt.apjc.amp.cisco.com

TCP 443

API (from FMC)

6.0 - 6.2: api.eu.amp.sourcefire.com

6.3+: api.eu.amp.cisco.com AND api.eu.amp.sourcefire.com

TCP 443

Secure Email Gateway (ESA)

Secure Web Appliance (WSA)

Secure Email and Web Manager

(SMA)

File Reputation (ESA/WSA)

>= 15.x: cloud-esa-asn.apjc.amp.cisco.com

cloud-esa-est.apjc.amp.cisco.com

< 15.x: cloud-sa.apjc.amp.cisco.com

TCP 443

API (ESA)

>= 15.x: api.apjc.amp.cisco.com

< 15.x: N/A

TCP 443

Event Server (ESA)

>= 15.x: intake.apjc.amp.cisco.com

< 15.x: N/A

TCP 443

Management Server (ESA)

>= 15.x: mgmt.apjc.amp.cisco.com

< 15.x: N/A

TCP 443

SDWAN

Disposition Server

cloud-isr-asn.apjc.amp.cisco.com

cloud-isr-est.apjc.amp.cisco.com

TCP 443

Required Server Addresses for Proper Cisco Secure Malware Analytics Cloud Access

For details on Secure Malware Analytic Cloud and Appliance, please refer to this article: Required IPs and Ports for Secure Malware Analytics

Required Server Addresses for Proper Orbital Use

Static IPs for Orbital 1.7+

North America Cloud (NAM) Cloud

Hostname

IP

Port

orbital.amp.cisco.com

54.71.115.87

54.68.234.245

54.200.174.54

443

ncp.orbital.amp.cisco.com

52.88.16.211

52.43.91.219

54.200.152.114

443

update.orbital.amp.cisco.com

54.71.197.112

54.188.114.190

54.188.131.5

443

NAT IPs for Remote Data Store

34.223.219.240

35.160.108.105

52.11.13.222

High random port number

For more information, please check the orbital help guide:  https://orbital.amp.cisco.com/help/

European (EU) Cloud

Hostname

IP

Port

orbital.eu.amp.cisco.com

3.120.91.16

18.196.194.92

3.121.5.209

443

ncp.orbital.eu.amp.cisco.com

18.194.154.159

18.185.217.177

18.184.249.36

443

update.orbital.eu.amp.cisco.com

3.123.83.189

18.184.240.159

35.158.29.104

443

NAT IPs for Remote Data Store

52.29.47.197

52.57.222.67

52.58.172.218

High random port number

For more information, please check the orbital help guide:  https://orbital.eu.amp.cisco.com/help/

Asia Pacific, Japan, China (APJC) Cloud

Hostname

IP

Port

orbital.apjc.amp.cisco.com

3.114.186.175

52.198.6.9

18.177.242.101

443

ncp.orbital.apjc.amp.cisco.com

18.177.250.245

13.230.62.75

18.176.196.172

443

update.orbital.apjc.amp.cisco.com

54.248.22.154

18.178.184.79

54.95.125.218

443

NAT IPs for Remote Data Store

52.194.143.206

52.69.138.67

54.95.9.136

High random port number

For more information, please check the orbital help guide:  https://orbital.apjc.amp.cisco.com/help/

Static IP Addresses

If your firewall blocks outbound TCP connections on port 443 (which is usually not the case), you must change your firewall settings before you update any policies. If your account was established after February 2016, you already have static IP addresses written into the standard policies. If your account was established prior to February 2016, you can contact the Cisco Technical Assistance Center (TAC) to request a migration of the policies to the static IP addresses.

Note: In order to ensure continuity of operations, and to ensure that the detected file malware dispositions are the same on both of the Firepower Management Centers, both the Primary and Secondary Management Centers must have access to the servers listed in this document.

Note: The Cisco Secure Endpoint Console does not use Static IPs and must be accessed through DNS.

Static IP Addresses in North America

Static IP Addresses in Europe

Static IP Addresses in APJC

23.23.197.169

23.23.198.191

23.23.224.83

50.16.242.171

50.16.244.193

50.16.250.236

52.0.55.209

52.2.63.194

52.2.128.246

52.3.149.24

52.3.178.163

52.3.190.47

52.4.98.101

52.4.151.41

52.4.245.162

52.4.246.178

52.5.92.125

52.6.103.57

52.6.197.200

52.20.14.163

52.20.123.238

52.20.141.147

52.21.52.149

52.21.117.50

52.21.134.210

52.22.64.192

52.22.156.183

52.23.13.34

52.23.16.199

52.23.73.146

52.23.87.4

52.23.107.89

52.23.134.105

52.23.140.222

52.70.11.137

52.70.13.27

52.70.35.37

52.70.47.45

52.70.56.136

52.70.58.10

52.70.59.59

52.70.59.121

52.70.60.74

52.70.61.174

52.70.61.181

52.70.61.193

52.70.63.25

54.83.45.221

54.88.208.235

54.204.8.61

54.221.210.7

54.221.255.190

54.225.226.117

54.225.227.9

54.225.227.30

54.225.227.45

54.225.227.105

54.225.228.145

54.225.228.166

54.225.228.244

54.227.247.102

107.20.158.55

107.20.203.8

107.20.229.191

107.20.234.220

107.21.212.157

107.21.217.202

107.21.218.60

128.177.8.0/24

174.129.203.65

54.161.128.60

54.234.131.176

52.206.206.244

34.225.208.192

52.22.120.193

34.199.250.32

34.199.238.4

34.194.224.132

34.198.112.150

34.224.236.198

52.20.233.31

192.111.4.0/24

192.111.7.0/24

54.71.197.112

54.188.114.190

54.188.131.5

192.35.177.23

104.18.39.201

172.64.148.55

104.18.4.5

104.18.5.5

52.3.48.165

52.6.245.67

34.120.67.236

34.98.122.109

46.51.181.139

46.51.182.195

46.51.182.202

46.137.99.242

52.16.63.115

52.16.95.58

52.16.105.95

52.16.166.193

52.16.177.94

52.16.193.225

52.16.220.180

52.17.93.43

52.17.102.100

52.17.106.35

52.17.179.163

52.17.211.190

52.17.233.49

52.18.9.153

52.18.28.229

52.18.79.226

52.18.109.209

52.18.187.129

52.18.187.166

52.18.223.41

52.19.84.244

52.19.167.56

52.30.25.70

52.30.74.163

52.30.124.82

52.30.160.113

52.30.175.205

52.30.179.236

52.30.196.206

52.30.208.114

52.30.217.4

52.30.217.226

52.30.255.133

52.31.30.249

52.31.66.59

52.31.83.94

52.31.119.97

52.31.122.77

52.31.127.190

52.31.137.201

54.195.248.52

54.195.249.18

54.217.232.226

54.217.232.234

54.217.232.241

54.217.232.244

54.217.232.249

54.228.250.255

54.246.88.192

54.247.189.117

54.74.229.75

107.21.250.31

107.21.236.143

52.2.128.246

52.18.202.103

52.18.119.87

192.111.5.0/24

34.249.48.182

34.248.52.55

99.81.233.22

3.123.83.189

18.184.240.159

35.158.29.104

192.35.177.23

104.18.39.201

172.64.148.55

104.18.4.5

104.18.5.5

52.3.48.165

52.6.245.67

34.120.67.236

34.98.122.109

54.250.127.0

52.197.2.58

52.197.22.41

52.69.16.172

13.112.137.80

52.198.208.254

13.112.162.167

54.249.244.218

54.249.246.210

54.249.243.85

54.249.240.219

54.248.98.94

176.34.47.0

52.192.82.189

52.68.180.106

52.196.247.47

52.196.185.158

52.197.74.4

52.69.39.127

54.248.113.224

54.238.55.12

54.249.248.16

52.197.50.93

52.193.124.132

52.69.108.228

52.197.72.147

52.197.22.165

52.68.82.200

52.197.35.73

52.197.39.251

52.68.251.104

54.249.253.42

54.249.253.65

176.34.60.211

52.192.198.119

52.196.96.41

54.248.116.199

52.196.117.29

52.196.134.7

176.34.60.30

52.192.145.214

52.192.221.107

52.193.182.191

52.193.201.169

52.193.223.43

52.193.233.17

52.196.115.166

52.196.31.86

52.197.121.237

52.198.147.230

52.198.195.125

52.198.202.24

52.198.221.53

52.198.223.169

52.198.225.221

52.198.226.104

52.198.26.36

52.198.94.104

52.199.124.11

52.199.127.80

52.199.92.142

52.68.1.146

54.248.107.84

54.248.109.124

54.248.126.98

54.248.236.127

54.248.236.141

54.248.236.144

54.248.236.151

54.248.237.93

54.249.246.7

54.250.127.131

192.111.6.0/24

54.248.22.154

18.178.184.79

54.95.125.218

192.35.177.23

104.18.39.201

172.64.148.55

18.180.25.43

54.95.253.127

54.249.195.77

104.18.4.5

104.18.5.5

52.3.48.165

52.6.245.67

34.120.67.236

34.98.122.109