Contents

Issue

The Secure Shell (SSH) access to Adaptive Security Appliance (ASA) software with Remote Authentication Dial-In User Service (RADIUS) using One-Time Password (OTP) fails when the CiscoSSH Stack is enabled.

These syslog messages are generated:

Nov 14 2025 16:28:35: %ASA-6-113010: AAA challenge received for user from server .

Nov 14 2025 16:28:35: %ASA-4-109033: Authentication failed for admin user from . Interactive challenge processing is not supported for SSH v1 connections

Environment

The symptoms are observed when all conditions match:

- Secure Firewall 1230 with ASA in single or multicontext mode. Other hardware platforms are also affected.

- RADIUS server is used for SSH authentication:

device# show run | i aaa

aaa-server RAD-OTP protocol radius

aaa-server RAD-OTP (management) host 192.0.2.1

aaa-server RAD-OTP (management) host 192.0.2.2

aaa authentication ssh console RAD-OTP

- The RADIUS server requests and requires a valid OTP code or challenge for successful authentication.

- CiscoSSH stack is enabled on ASA.

- In versions 9.19.1 and later the CiscoSSH stack is enabled by default and can be optionally disabled using the no ssh stack cisco command. Use the show ssh command for verification:

device# show ssh

ssh secure copy : ENABLED

ciscoSSH stack : DISABLED

- In versions 9.23.1 and later this stack cannot be disabled or verified.

Resolution

The symptoms  are successful reproduced in the internal lab and tracked in the Cisco bug ID CSCwt57790.

Use one of these workaround options in affected versions:

- Use local authentication for SSH connections.

- On the RADIUS server disable OTP requirement for ASA.

- In earlier than 9.23 disable the CiscoSSH stack using the no ssh stack cisco command. Ensure to review Cisco Secure Firewall ASA Series Command Reference, S Commands and assess the potential impact of disabling the CiscoSSH stack.

Cause

The cause of the authentication failure is the Cisco bug ID CSCwt57790.

Related Content

- Cisco bug ID CSCwi04513

- Cisco bug ID CSCwt57790

- Cisco Secure Firewall ASA Series Command Reference, S Commands