Contents

Introduction

Prerequisites

Abbreviations

Verify Different Updates Version

1. Product Software Version

2. SRU and VDB Update Version

3. GeoDB Update Version

Introduction

This document describes how to verify different updates version on Firepower Command Line Interface (CLI).

Prerequisites

Cisco recommends that you have knowledge of these products:

- Firepower Management Center (FMC)

- Firepower Threat Defense (FTD)

Abbreviations

- Firepower Management Center (FMC)

- Firepower Threat Defense (FTD)

- Secure Rule Update or Sourcefire Rule Update (SRU)

- Lightweight Security Package (LSP)

- Vulnerability Database (VDB)

- GeoLocation Database (GeoDB)

Verify Different Updates Version

1. Product Software Version

On FMC and FTD CLI, you can verify currently running product software version by the command:

show version

Example: Command output from FMC CLI.

Copyright 2004-2023, Cisco and/or its affiliates. All rights reserved.

Cisco is a registered trademark of Cisco Systems, Inc.

All other trademarks are property of their respective owners.

Cisco Firepower Extensible Operating System (FX-OS) v2.12.0 (build 499)

Cisco Secure Firewall Management Center for VMware v7.2.4 (build 169)

>

> show version

-----------------[ FMC ]-----------------

Model                : Secure Firewall Management Center for VMware (66) Version 7.2.4 (Build 169)   <- - Display running FMC software version.

UUID                 : 6308d00c-54c3-11ee-a889-c4b0f35cec33

Rules update version: 2023-10-02-002-vrt

LSP version          : lsp-rel-20231002-1553

VDB version          : 372

----------------------------------------------------

Example: Command output from FTD CLI.

Copyright 2004-2022, Cisco and/or its affiliates. All rights reserved.

Cisco is a registered trademark of Cisco Systems, Inc.

All other trademarks are property of their respective owners.

Cisco Firepower Extensible Operating System (FX-OS) v2.10.1 (build 1400)

Cisco Firepower Threat Defense for VMware v7.0.5 (build 72)

>

> show version

-------------------[ FTD ]--------------------

Model                 : Cisco Firepower Threat Defense for VMware (75) Version 7.0.5 (Build 72) <- - Display running FTD software version.

UUID                  : 48797b40-463e-11ed-92b0-d0e26b47dcc4

Rules update version  : 2023-10-02-002-vrt

VDB version           : 372

---------------------------------------------------

2. SRU and VDB Update Version

On FMC and FTD CLI, you can verify currently running SRU (Snort2) and LSP (Snort3) update version, and VDB version by the command:

show version

Example: Command output from FMC CLI.

Copyright 2004-2023, Cisco and/or its affiliates. All rights reserved.

Cisco is a registered trademark of Cisco Systems, Inc.

All other trademarks are property of their respective owners.

Cisco Firepower Extensible Operating System (FX-OS) v2.12.0 (build 499)

Cisco Secure Firewall Management Center for VMware v7.2.4 (build 169)

>

> show version

-----------------[ FMC ]-----------------

Model                : Secure Firewall Management Center for VMware (66) Version 7.2.4 (Build 169)

UUID                 : 6308d00c-54c3-11ee-a889-c4b0f35cec33

Rules update version: 2023-10-02-002-vrt                       <- - Display installed SRU (Snort2) version.

LSP version          : lsp-rel-20231002-1553                    <- - Display installed LSP (Snort3) version.

VDB version          : 372                                      <- - Display running VDB version.

----------------------------------------------------

Example: Command output from FTD CLI Snort2.

Copyright 2004-2022, Cisco and/or its affiliates. All rights reserved.

Cisco is a registered trademark of Cisco Systems, Inc.

All other trademarks are property of their respective owners.

Cisco Firepower Extensible Operating System (FX-OS) v2.10.1 (build 1400)

Cisco Firepower Threat Defense for VMware v7.0.5 (build 72)

>

> show version

-------------------[ FTD ]--------------------

Model                 : Cisco Firepower Threat Defense for VMware (75) Version 7.0.5 (Build 72)

UUID                  : 48797b40-463e-11ed-92b0-d0e26b47dcc4

Rules update version  : 2023-10-02-002-vrt                       <- - Display running SRU (Snort2) version.

VDB version           : 372                                      <- - Display running VDB version.

---------------------------------------------------

Example: Command output from FTD CLI Snort3.

Copyright 2004-2022, Cisco and/or its affiliates. All rights reserved.

Cisco is a registered trademark of Cisco Systems, Inc.

All other trademarks are property of their respective owners.

Cisco Firepower Extensible Operating System (FX-OS) v2.12.0 (build 8)

Cisco Firepower Threat Defense for VMware v7.2.0 (build 18)

>

> show version

-------------------[ FTD ]-------------------

Model            : Cisco Firepower Threat Defense for VMware (75) Version 7.2.0 (Build 18)

UUID             : c04f9496-db0e-11ed-81a1-942878af0a8c

LSP version      : lsp-rel-20231002-1553                         <- - Display running LSP (Snort3) version.

VDB version      : 372                                           <- - Display running VDB version.

----------------------------------------------------

3. GeoDB Update Version

On FMC and FTD CLI (in expert mode), you can verify currently running GeoDB version by the command:

cat /var/sf/geodb/country_code_map_version

Example: Command output from FMC CLI.

Copyright 2004-2023, Cisco and/or its affiliates. All rights reserved.

Cisco is a registered trademark of Cisco Systems, Inc.

All other trademarks are property of their respective owners.

Cisco Firepower Extensible Operating System (FX-OS) v2.12.0 (build 499)

Cisco Secure Firewall Management Center for VMware v7.2.4 (build 169)

>

> expert

rirana@FMC:~$ sudo su -

Password:

root@FMC:~#

root@FMC:~# cd /var/sf/geodb/

root@FMC:/var/sf/geodb#

root@FMC:/var/sf/geodb# cat country_code_map_version       <- - To display running GeoDB update version.

2023-09-25-100                                             <- - FMC GeoDB update version is 2023-09-25-100.

Example: Command output from FTD CLI.

Copyright 2004-2022, Cisco and/or its affiliates. All rights reserved.

Cisco is a registered trademark of Cisco Systems, Inc.

All other trademarks are property of their respective owners.

Cisco Firepower Extensible Operating System (FX-OS) v2.10.1 (build 1400)

Cisco Firepower Threat Defense for VMware v7.0.5 (build 72)

>

> expert

FTD:~$ sudo su -

Password:

root@FTD:~#

root@FTD:/# cd /var/sf/geodb/

root@FTD:geodb#

root@FTD:geodb# cat country_code_map_version              <- - To display running GeoDB update version.

2023-09-25-100                                            <- - FTD GeoDB update version is 2023-09-25-100.