Contents

Introduction

Prerequisites

Requirements

Components Used

Problem

Solution

Introduction

This document describes how to identify the engine responsible for a specific detection in the Secure Endpoint console.

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- Cisco Secure Endpoint console

Components Used

The information in this document is based on these software versions:

- Secure Endpoint Console v5.4.2025030619

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Problem

Identifying the correct engine responsible for a specific detection is one of the initial steps in understanding the nature of the event and effectively triaging it.

Solution

1. Navigate to the Events page in your AMP console to find the event you wish to investigate further.

2. Click the highlighted icon to open Device Trajectory.
Device Trajectory Icon

3. You can view the event details to the right under Activity Details.
Event Details in Device Trajectory

4. Scroll to the bottom to locate the Detected by section.
Detected By Section

Tip: Understanding this information is essential for assessing the nature of the threat and swiftly determining the appropriate exclusion to configure. Additionally, providing these details when submitting a case to TAC for False Positive investigations can help expedite the process.

If you are unable to view the Detected By section or for any further assistance, contact TAC.