Contents

Introduction

Prerequisites

Requirements

Components Used

Configure an IP Allow/Block List with Secure Endpoint

What is an IP Allow/Block List?

IP Addresses Examples

What is an IP Allow List?

What is an IP Block List?

What is an Isolation IP Allow List?

Create an IP Allow/Block List

Additional Configuration Example

Introduction

This document describes the IP Allow/Block feature within Cisco Secure Endpoint.

Prerequisites

Requirements

Cisco recommends that you have access to the Cisco Secure Endpoints portal.

Components Used

The information in this document is based on the Secure Endpoint console.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Configure an IP Allow/Block List with Secure Endpoint

What is an IP Allow/Block List?

IP block and allow lists are used with device flow correlation to define custom IP address detections. After you have created your lists, you can then define in the policy to use them in addition to the Cisco Intelligence Feed or on their own. The lists can be defined to use individual IP addresses, CIDR blocks, or IP address and port combinations. When you submit a list, redundant addresses are combined on the back end.

IP Addresses Examples

If you add these entries to a list:

- 192.0.2.0/24

- 192.0.2.15

- 192.0.2.135

- 192.0.2.200

The list is processed with a net result of:

- 192.0.2.0/24

However, if you also include ports the result is different:

- 192.0.2.0/24

- 192.0.2.15:80

- 192.0.2.135

- 192.0.2.200

The list is processed with a net result of:

- 192.0.2.0/24

- 192.0.2.15:80

What is an IP Allow List?

An IP allow list enables you to specify IP addresses you never want to detect. Entries in your IP allowed list create an override in your IP blocked list as well as the Cisco Intelligence Feed. You can choose to add single IP addresses, entire CIDR blocks, or specify IP addresses with port numbers.

What is an IP Block List?

An IP block list allows you to specify IP addresses you want to detect any time one of your computers connects to them. You can choose to add single IP addresses, entire CIDR blocks, or specify IP addresses with port numbers. When a computer makes a connection to an IP address in your list the action taken depends on what you have specified in the Network section of your policy.

What is an Isolation IP Allow List?

An Isolation IP allow list specifies the IP addresses that are not blocked during isolation.  Isolation IP allow lists are different from IP Allow Lists in that Isolation IP allow lists do not support port numbers in the rule.

Create an IP Allow/Block List

Step 1. In order to create an IP list, navigate to Outbreak Control in the Secure Endpoint portal and click IP Block & Allow Lists option, as shown in the image.

IP Block And Allow List

Step 2. Select Create IP List feature, as shown in the image.

Create IP List

Step 3. It displays the New IP List page. Enter the name and description for the new list and select Allow, Block, or Isolation Allow from the List Type drop-down list, as shown in the image.

IP List Configuration

Step 4. You can enter one IP address or CIDR block per row. You have this option to enter an IP address(s):

- You can click Add Row to add single rows.

- You can also quickly add multiple IP addresses and CIDR blocks if you select Add Multiple Rows.

- You can then enter or paste a list of IP addresses and CIDR blocks into the dialog, then click Add Rows when you are done.

- You can also upload a CSV file that contains IP addresses and CIDR blocks separated by newline characters. To upload the file,

click Upload then click Browse to select the CSV file and click Upload. For list type, choose whether you want this to be an allow list, block list, or Isolation allow.

Step 5. Save your IP address list configuration when you are finished.

Additional Configuration Example

To add a port to a block or allow list regardless of IP address, you can add two entries to the appropriate list where XX is the port number you want to block:

- 0.0.0.1/1:XX

- 128.0.0.1/1:XX

Note: Uploaded IP lists can contain up to 100,000 lines or be a maximum of 2 MB in size. Only IPv4 addresses are currently supported.