Contents

Introduction

Overview

Disclaimer

Email Appliance Migration Paths

Hardware Requirements to Migrate from C19X

Hardware Requirements to Migrate from C39X

Hardware Requirements to Migrate from C69X

Management Appliance Migration Paths

Hardware Requirements to Migrate from M19X

Hardware Requirements to Migrate from M39X

Hardware Requirements to Migrate from M69X

Deployment Design Guide

Up to 1K Users

Up to 10K Users

Up to 50K Users

Up to 100K Users

Related Information

Introduction

This document describes how to migrate from an older hardware (HW) model to a new virtual environment.

Overview

Cisco has decided to end the sales for the dedicated x95 email appliances that were supported on Cisco UCS C-Series.

Customers with email appliances can still maintain those until the last day of hardware support, which is 30-Sep-2028.

New customers looking to deploy on-premises or with email appliances already out of hardware support can use this document to prepare their deployment/migration.

The goal of this document is to provide guidance about the required Cisco Unified Computing System (UCS) M7 hardware that matches the current X9X email appliances. It provides a 1:1 comparison as well as some scaling scenarios for 1K, 10K, 50K, and 100K mailboxes.

The hardware recommended for the 1:1 replacement is the one available at the time of this writing. New hardware like CPU, Disks, Memories, and so on, can become available making the configuration obsolete or not cost-optimized.

Cisco updates this document as frequently as possible, in order to ensure the information present here is as accurate as possible.

Disclaimer

This document provides guidance for Email appliance migration to a new virtual environment. The hardware and products proposed are the most recommended ones at the time of writing. The products proposed in this document can change in the future.

Customers and partners are responsible for confirming that the hardware configuration has all the required components to meet the solution requirements. Refer to the Additional Resources for the Sizing tool link.

Please ensure you engage a Cisco UCS Expert to validate your configuration.

Email Appliance Migration Paths

Hardware Requirements to Migrate from C19X

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

1

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

9

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

31

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCSC-PSU-BLK-D

Power Supply Blanking Panel for M7 / M8 servers

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

1

UCS-MRX16G1RE1

16GB DDR5-4800 RDIMM 1Rx8  (16Gb)

1

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCS-SD240GBM1XEVD

240GB 2.5in Enter Value 6G SATA Micron G2 SSD

1

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

1

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

1

UCS-SID-INFR-UNK-D

Unknown

1

Hardware Requirements to Migrate from C39X

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

1

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

9

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

31

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCSC-PSU-BLK-D

Power Supply Blanking Panel for M7 / M8 servers

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

1

UCS-MRX32G1RE1

32GB DDR5-4800 RDIMM 1Rx4  (16Gb)

1

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCS-SD960GBM1XEVD

960GB 2.5in Enter Value 6G SATA Micron G2 SSD

1

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

1

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

1

UCS-SID-INFR-UNK-D

Unknown

1

Hardware Requirements to Migrate from C69X

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

2

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

9

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

30

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

2

UCS-MRX32G1RE1

32GB DDR5-4800 RDIMM 1Rx4  (16Gb)

2

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCS-SD960GBM1XEVD

960GB 2.5in Enter Value 6G SATA Micron G2 SSD

1

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

2

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

2

UCS-SID-INFR-UNK-D

Unknown

1

UCS-SID-WKL-UNK-D

Unknown

1

Management Appliance Migration Paths

Hardware Requirements to Migrate from M19X

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

1

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

9

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

31

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCSC-PSU-BLK-D

Power Supply Blanking Panel for M7 / M8 servers

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

1

UCS-MRX16G1RE1

16GB DDR5-4800 RDIMM 1Rx8  (16Gb)

1

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCSSD480G6I1XEV-D

480 GB 2.5in Enter Value 6G SATA Intel SSD

1

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

1

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

1

UCS-SID-INFR-UNK-D

Unknown

1

Hardware Requirements to Migrate from M39X

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

1

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

9

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

31

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCSC-PSU-BLK-D

Power Supply Blanking Panel for M7 / M8 servers

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

1

UCS-MRX32G1RE1

32GB DDR5-4800 RDIMM 1Rx4  (16Gb)

1

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCS-SD19T6S1XEV-D

1.9TB 2.5in Enter Value 6G SATA Samsung SSD

1

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

1

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

1

UCS-SID-INFR-UNK-D

Unknown

1

Hardware Requirements to Migrate from M69X

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

1

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

8

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

31

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCSC-PSU-BLK-D

Power Supply Blanking Panel for M7 / M8 servers

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

1

UCS-MRX32G1RE1

32GB DDR5-4800 RDIMM 1Rx4  (16Gb)

1

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCS-SD19TBM1XEV-D

1.9TB 2.5in Enter Value 6G SATA Micron G2 SSD

2

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

1

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

1

UCS-SID-INFR-UNK-D

Unknown

1

UCS-SID-WKL-UNK-D

Unknown

1

CNDL-DESELECT-D

Conditional Deselect

1

Deployment Design Guide

These configurations can be utilized as guidelines for the number of users mentioned. For more accurate server requirements, navigate to this site.

These configurations were made using the default values on the mentioned site.

Up to 1K Users

1x UCS-C M7 Server with 1x C100v running.

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

1

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

9

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

31

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCSC-PSU-BLK-D

Power Supply Blanking Panel for M7 / M8 servers

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

1

UCS-MRX16G1RE1

16GB DDR5-4800 RDIMM 1Rx8  (16Gb)

1

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCS-SD240GBM1XEVD

240GB 2.5in Enter Value 6G SATA Micron G2 SSD

1

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

1

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

1

UCS-SID-INFR-UNK-D

Unknown

1

Up to 10K Users

1x UCS-C M7 Server with 3x C300v running.

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

1

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

1

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

1

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

1

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

1

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

2

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

8

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

30

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

1

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

1

CBL-SATA-C220-D

SATA cable C220M7 (1U)

1

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

1

UCS-CPU-I4410T

Intel I4410T 2.7GHz/150W 10C/26.25MB DDR5 4000MT/s

2

UCS-MRX32G1RE1

32GB DDR5-4800 RDIMM 1Rx4  (16Gb)

2

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

1

UCS-SD19TBM1XEV-D

1.9TB 2.5in Enter Value 6G SATA Micron G2 SSD

2

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

2

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

1

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

2

UCS-SID-INFR-UNK-D

Unknown

1

UCS-SID-WKL-UNK-D

Unknown

1

CNDL-DESELECT-D

Conditional Deselect

1

Up to 50K Users

2x UCS-C M7 Servers with 12x C600v running.

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

2

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

2

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

2

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

2

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

2

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

4

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

16

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

60

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

2

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

2

CBL-SATA-C220-D

SATA cable C220M7 (1U)

2

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

2

UCS-CPU-I8462Y+

Intel I8462Y+ 2.8GHz/300W 32C/60MB DDR5 4800MT/s

4

UCS-MRX64G2RE1

64GB DDR5-4800 RDIMM 2Rx4  (16Gb)

4

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

2

UCS-SD19TBM1XEV-D

1.9TB 2.5in Enter Value 6G SATA Micron G2 SSD

4

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

4

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

4

UCS-SID-INFR-UNK-D

Unknown

2

UCS-SID-WKL-UNK-D

Unknown

2

CNDL-DESELECT-D

Conditional Deselect

1

Up to 100K Users

4x UCS-C M7 Servers with 24x C600v running.

PID

Description

Quantity

UCS-M7-MLB

UCS M7 RACK MLB

1

UCSC-C220-M7S

UCS C220 M7 Rack w/oCPU, mem, drv, 1U wSFF HDD/SSD backplane

4

CON-L1NCO-UCSCUC27

CX LEVEL 1 8X7XNCDOS UCS C220 M7 Rack w/oCPU, mem, drv, 1U w

4

UCSX-TPM-002C-D

TPM 2.0, TCG, FIPS140-2, CC EAL4+ Certified, for servers

4

UCSC-RAIL-NONE-D

NO RAIL KIT OPTION

4

CIMC-LATEST-D

IMC SW (Recommended) latest release for C-Series Servers.

4

UCSC-HSLP-C220M7

UCS C220 M7 Heatsink for & C240 GPU Heatsink

8

UCSC-BBLKD-M7

UCS C-Series M7 SFF drive blanking panel

32

UCS-DDR5-BLK

UCS DDR5 DIMM Blanks

120

UCSC-SATAIN-220M7

UCS C220 M7 SATA Interposer Board

4

UCSC-FBRS-C220-D

C220M7 HH Riser3 blank

4

CBL-SATA-C220-D

SATA cable C220M7 (1U)

4

UCSC-FBRS2-C220M7

C220 M7 Riser2 HH Filler Blank

4

UCS-CPU-I8462Y+

Intel I8462Y+ 2.8GHz/300W 32C/60MB DDR5 4800MT/s

8

UCS-MRX64G2RE1

64GB DDR5-4800 RDIMM 2Rx4  (16Gb)

8

UCSC-RIS1A-22XM7

UCS C-Series M7 1U Riser 1A PCIe Gen4 x16 HH

4

UCS-SD19TBM1XEV-D

1.9TB 2.5in Enter Value 6G SATA Micron G2 SSD

8

UCSC-P-IQ1GC

Cisco-Intel I710-T4L 4x1GBASE-T NIC

1

UCSC-PSU1-1200W-D

1200W Titanium power supply for C-Series Servers

8

CAB-9K10A-EU

Power Cord, 250VAC 10A CEE 7/7 Plug, EU

8

UCS-SID-INFR-UNK-D

Unknown

4

UCS-SID-WKL-UNK-D

Unknown

4

CNDL-DESELECT-D

Conditional Deselect

1

Related Information

Leverage this guide in order to support you on the Secure Email Gateway (ESA)/Security Management Appliance (SMA) configuration migration from appliance to virtual model:

- Cisco Secure Email Gateway Sizing tool

- Cisco Secure Email Virtual Gateway and Secure Email and Web Manager Virtual Appliance Installation Guide

- ESA/SMA Virtual Deployment FAQ

- How to Load or Migrate ESA Configuration on a Replacement ESA

- Cisco Technical Support & Downloads