Contents

Introduction

This document describes how to change the IP address of a Secure Cloud Analytics ONA sensor.

Question: How do i change the IP address on my Secure Cloud Analytics ONA sensor

Answer:

- Log into the ONA Sensor CLI

- Make a backup of the file in /etc/netplan/[file_name].yml

- sudo cp /etc/netplan/[file_name].yml /opt/obsrvbl-ona/[file_name].yml.bak

- Use nano or vi to edit the netplan yml configuration file

- "sudo nano [file_name].yml"

- Update the IP address and Gateway and save the yml file.

- Reapply the newly updated netplan configuration

- sudo netplan apply

The screenshot shows an example /etc/netplan/01-netcfg.yaml configuration file from a lab system