Contents

Introduction

Prerequisites

Requirements

Components Used

Restart Firewall Management Center Processes

Restart Processes with the Web UI

Restart Processes with the CLI

Restart Managed Device Processes

FirePOWER Appliance, ASA FirePOWER Module, and NGIPS Virtual Device

Series 2 Managed Device

Related Information

Introduction

This document describes how to restart the services on a Cisco Firewall Management Center appliance with either a web User Interface (UI) or a CLI.

Prerequisites

Requirements

There are no specific requirements for this document.

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Restart Firewall Management Center Processes

To troubleshoot an issue, you can restart the processes and services that run on the FireSIGHT Management Center appliance. You can restart these services and processes without the need to reboot the appliance, as described in the sections that follow.

Restart Processes with the Web UI

Complete these steps to restart the Firewall Management Center processes via the web UI:

1. Log into the web UI of your Firewall Management Center.

2. Navigate to System > Configuration > Process.

3. Click Run Command for the Restart Management Center Console. This restarts the services and processes.

Restart Processes with the CLI

Complete these steps to restart the Firewall Management Center processes via the CLI:

1. Log into the CLI of the Firewall Management Center.

2. Enter expert mode:
> expert

admin@masolorifirepowermanager:~$

3. Elevate your privilege level to the root user mode:

admin@masolorifirepowermanager:~$ sudo su -

Password:

root@masolorifirepowermanager:~#

1. Enter this command into the CLI to restart the console:

root@masolorifirepowermanager:~# /etc/rc.d/init.d/console restart

Restart Managed Device Processes

This section describes how to restart the processes that run on a managed device.

FirePOWER Appliance, ASA FirePOWER Module, and NGIPS Virtual Device

Complete these steps to restart the processes that run on a FirePOWER appliance, Cisco Adaptive Security Appliance (ASA) module, or a Next Generation Intrusion Prevention System (NGIPS) virtual device:

1. Log into the CLI of the managed device via Secure Shell (SSH).

2. If you run a FirePOWER (SFR) Service Module on an ASA, you must enter this command on the ASA to access the SFR module:

ciscoasa# session sfr console

Opening console session with module sfr.

Connected to module sfr. Escape character sequence is 'CTRL-^X'.

FirePOWER login:

3. After you provide the user credentials and successfully log into the shell, enter this command to restart the services:

> system restart

This command will restart the application.  Continue?

Please enter 'YES' or 'NO': YES

Series 2 Managed Device

Complete these steps to restart the processes that run on a Series 2 managed device:

1. Log into the CLI of the Sourcefire managed device.

2. Elevate your privilege level to the root user mode:

admin@FirePOWER:~$ sudo su -

3. Enter this command into the CLI to restart the processes that run on a managed device:

root@FirePOWER:~# /etc/rc.d/init.d/sensor restart

Related Information

- Cisco Technical Support & Downloads