Contents

Introduction

Q. How to change network settings on Cyber Vision Center

Option #1

Option #2

Checking Network Status

Introduction

This document describes the steps needed to change the network settings on a Cyber Vision Center after installation. It’s applicable to 3.x & 4.x software trains.

Q. How to change network settings on Cyber Vision Center

A.   There are two ways to accomplish this.

Option #1

From the center CLI, type the command below (Root access will be required)

sbs-netconf

This will invoke the Wizard to make the configuration changes. It can be done by selecting the interface of interest.

Option #2

Navigate to /data/etc/systemd/network directory from the CLI of the server.

The files below should be modified depending on the interface that requires a change.

- 00-eth0-static.network (Access Interface - Web)

- 00-eth1-static.network (Collection interface - Sensors)

Example of contents in the eth0 interface config file:

Checking Network Status

From the CLI, gain root access using ‘sudo -i’

1. To view the configuration on the networking interface, use ifconfig <Interface>

ifconfig eth0

2. To display the IP routing table in complete numeric form, use
route -n