Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

Configure

Configuring an Output Destination

Step 1. Syslog Server Configuration

Step 2.SNMP Server configuration

Configuration for sending the Traffic Events

Enable external logging for Connection Events

Enable external logging for Intrusion Events

Enable external logging for IP Security Intelligence/DNS Security Intelligence/URL Security Intelligence

Enable external logging for SSL events

Configuration for sending the System Events

Enable external logging for system events

Verify

Troubleshoot

Related Information

Related Cisco Support Community Discussions

Introduction

This document describes Firepower module’s system/ traffic events and various method of sending these events to an external logging server.

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- Knowledge of ASA (Adaptive Security Appliance) firewall, ASDM (Adaptive Security Device Manager).

- Firepower appliance Knowledge.

- Syslog, SNMP protocol knowledge.

Components Used

The information in this document is based on these software and hardware versions:

- ASA Firepower modules (ASA 5506X/5506H-X/5506W-X,  ASA 5508-X, ASA 5516-X ) running software version 5.4.1 and above.

- ASA Firepower module  (ASA 5515-X, ASA 5525-X, ASA 5545-X, ASA 5555-X) running software version 6.0.0 and above.

- ASDM 7.5(1) and above.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Background Information

Type of Events

Firepower Module events can be categorized in two types:-

1. Traffic Events (Connection events/Intrusion Events/Security Intelligence Events/SSL Events/Malware/File Events).

2. System Events (Firepower Operating System (OS) events).

Configure

Configuring an Output Destination

Step 1. Syslog Server Configuration

To configure a Syslog Server for traffic events, Navigate to Configuration > ASA Firepower Configuration > Policies > Actions Alerts  and click the Create Alert drop-down menu and choose option Create Syslog Alert. Enter the values for the Syslog server.

Name:  Specify the name which uniquely identifies the Syslog server.

Host:  Specify the IP address/hostname of Syslog server.

Port:  Specify the port number of Syslog server.

Facility:  Select any facility  that is configured on your Syslog server.

Severity:  Select any Severity that is configured on your Syslog server.

Tag:  Specify tag name that you want to appear with the Syslog message.

Step 2.SNMP Server configuration

To configure an SNMP Trap server  for traffic events, Navigate to ASDM Configuration > ASA Firepower Configuration > Policies > Actions Alerts  and click the Create Alert drop-down menu and choose option Create SNMP Alert.

Name:  Specify the name which uniquely identifies the SNMP Trap server.

Trap Server:  Specify IP address/hostname of SNMP trap server.

Version:  Firepower Module supports SNMP v1/v2/v3. Select the SNMP version from the drop down menu.

Community string:  If you select  v1 or v2 in Version option, Specify the SNMP community name.

Username:  If you select  v3 in Version option, the system prompts User Name field. Specify the username.

Authentication:  This option is a part of SNMP v3 configuration. It provides authentication based on the Hash

algorithm using either MD5 or SHA algorithms. In Protocol drop down menu select the hash algorithm & enter

password in Password option. If you do not want to use this feature, then select None option.

Privacy: This option is a part of SNMP v3 configuration. It provides encryption using DES algorithm. In Protocol drop menu select the option as DES& enter password in Password field. If you do not want to use data encryption feature, then choose None option.

Configuration for sending the Traffic Events

Enable external logging for Connection Events

Connection Events are generated when traffic hits an access rule with logging enabled. In order to enable the external logging for connection events, navigate to (ASDM Configuration > ASA Firepower Configuration >  Policies > Access Control Policy) edit the access rule and navigate to logging option.

Select the logging option either log at Beginning and End of Connection or log at End of Connection. Navigate to Send Connection Events to option and specify where to send events.

In order to send events to an external Syslog server, select Syslog, and then select a Syslog alert response from the drop-down list. Optionally, you can add a Syslog alert response by clicking the add icon.

To send connection events to an SNMP trap server, select SNMP Trap, and then select an SNMP alert response from the drop-down list. Optionally, you can add an SNMP alert response by clicking the add icon.

Enable external logging for Intrusion Events

Intrusion events are generated when a signature (snort rules) matches some malicious traffic. In order to enable the external logging for intrusion events, navigate to ASDM Configuration > ASA Firepower Configuration >  Policies> Intrusion Policy > Intrusion Policy. Either create a new Intrusion policy or edit existing Intrusion Policy.Navigate to Advanced Setting > External Responses.

In order to send intrusion events to an external SNMP server, select  Enabled option in SNMP Alerting and then click the Edit option.

Trap Type: The trap type is used for IP addresses that appear in the alerts. If your network management system correctly renders the INET_IPV4 address type, then you can select as Binary. Otherwise, select as String.

SNMP Version:  Select either Version 2 or Version 3 radio button.

SNMP v2 option

Trap Server: Specify the IP address/hostname of SNMP Trap server, as shown in this image.

Community String: Specify the community name.

SNMP v3 Option

Trap Server: Specify the IP address/hostname of SNMP Trap server, as shown in this image.

Authentication Password: Specifypassword required for authentication. SNMP v3 uses the hash function to authenticate the password.

Private Password: Specify password for encryption. SNMP v3 uses Data Encryption Standard (DES) block cipher to encrypt this password.

User Name: Specify the Username.

In order to send intrusion events to an external Syslog server, select option Enabled in Syslog Alerting then click the Edit option, as shown in this image.

Logging Host:Specify the IP address/hostname of Syslog server.

Facility: Select any facility  that is configured on your Syslog server.

Severity: Select any Severity that is configured on your Syslog server.

Enable external logging for IP Security Intelligence/DNS Security Intelligence/URL Security Intelligence

IP Security Intelligence/DNS Security Intelligence/URL Security Intelligence events are generated when traffic matches any IP address/domain name/URL Security Intelligence database. In order to enable the external logging for IP/ URL/DNS Security Intelligence Events, navigate to (ASDM Configuration > ASA Firepower Configuration >  Policies > Access Control Policy > Security Intelligence),

Click the icon as shown in the image to enable the logging for IP/DNS/URL Security Intelligence. Clicking the icon prompts a dialog box to enable logging and option to send the events to the external server.

In order to send events to an external Syslog server, select Syslog, and then select a Syslog alert response from the drop-down list. Optionally, you can add a Syslog alert response by clicking the add icon.

In order to send connection events to an SNMP trap server, select SNMP Trap, and then select an SNMP alert response from the drop-down list. Optionally, you can add an SNMP alert response by clicking the add icon.

Enable external logging for SSL events

SSL events are generated when traffic matches any rule in SSL policy, in which logging is enabled. In order to enable the external logging for SSL traffic, navigate to ASDM Configuration > ASA Firepower Configuration >  Policies > SSL. Edit the existing or create a new rule and navigate to logging option.Select log at End of Connection option.

Then navigate to Send Connection Events to and specify where to send the events.

To send events to an external Syslog server, select Syslog, and then select a Syslog alert response from the drop-down list. Optionally, you can add a Syslog alert response by clicking the add icon.

To send connection events to an SNMP trap server, select SNMP Trap, and then select an SNMP alert response from the drop-down list. Optionally, you can add an SNMP alert response by clicking the add icon.

Configuration for sending the System Events

Enable external logging for system events

System events show the status of Firepower Operating System. SNMP manager can be used to poll these systems events.

To configure SNMP server in order to poll system events from Firepower Module, you need to configure a System Policy which makes the information available in firepower MIB (Management Information Base) which can be polled by the SNMP server.

Navigate to ASDM Configuration > ASA Firepower Configuration >  Local > System Policy and click the SNMP.

SNMP Version:  Firepower Module supports SNMP v1/v2/v3. Specify the SNMP version.

Community string:  If you select v1/ v2 in SNMP version option, type the SNMP community name in the Community String field.

Username:  If you select the v3 option in version option. Click the Add User  button and specify the Username in the username field.

Authentication:  This option is a part of SNMP v3 configuration. It provides authentication based on the Hashed Message Authentication Code  using MD5 or SHA algorithms. Choose Protocol for hash algorithm & enter password

in Password field. If you do not want to use authentication feature then select None option.

Privacy:  This option is a part of SNMP v3 configuration. It provides encryption using DES/AES algorithm. Select protocol for encryption & enter password in Password field. If you do not want data encryption feature then choose None option.

Note: A management information base (MIB)is a collection of information that is organized hierarchically. MIB file (DCEALERT.MIB) for Firepower Module is available at directory location (/etc/sf/DCEALERT.MIB) which can be fetched from this directory location.

Verify

There is currently no verification procedure available for this configuration.

Troubleshoot

There is currently no specific troubleshooting information available for this configuration.

Related Information

- Technical Support & Documentation - Cisco Systems