Contents

Introduction

What are the known AV incompatibilities with the Cisco AMP for Endpoints Linux connector?

Introduction

This document describes the Anti-Virus (AV) incompatibilities on the AMP for Endpoints Linux connector.

What are the known AV incompatibilities with the Cisco AMP for Endpoints Linux connector?

The list of AV applications which are known to interfere with AMP for Endpoints Linux connector is as provided:

- F-Secure Linux Security on RHEL/CentOS 6.x.

- Kaspersky Endpoint Security.

- McAfee VSE for Linux.

- McAfee Endpoint Security for Linux.

- Sophos Server Security 9 on RHEL/CentOS 6.x.

- Symantec Endpoint Protection.

- Carbon Black on RHEL 7.

- Trend Micro DSA (Deep Security Agent).

Note: There may be additional applications or updates that may cause compatible applications to become problematic. Please refer to the user's guide, specifically the Linux chapter for further details (https://docs.amp.cisco.com/en/A4E/AMP%20for%20Endpoints%20User%20Guide.pdf ).