Contents

Introduction

Enterprise Linux Release 6

Enterprise Linux Release 7

Enterprise Linux Release 8

Ubuntu Release 20.04 LTS

Amazon Linux Release 2

Legend

Notes

Introduction

This table contains reboot requirements for Cisco Secure Endpoint Linux connector updates. For more information on supported operating systems for the Linux connector, refer to the the Cisco Secure Endpoint Linux Connector OS Compatibility article.

Enterprise Linux Release 6

From Version

To Version

1.7.0

and newer

1.8.1

and newer

1.10.0

and newer

1.12.2

and newer

1.12.4

and newer

1.7.0 and newer

See Note 1

See Note 3

See Note 4

1.8.1 and newer

1.10.0 and newer

1.12.2 and newer

1.12.4 and newer

Enterprise Linux Release 7

From Version

To Version

1.7.0

1.8.0

1.8.1

1.8.4

1.9.0

1.9.1

1.10.0

and newer

1.6.0

1.7.0

1.8.0

1.8.1

See Note 2

1.8.4

1.9.0

1.9.1 and newer

Enterprise Linux Release 8

From Version

To Version

1.13.0

and newer

1.13.0 and newer

Ubuntu Release 20.04 LTS

From Version

To Version

1.15.0

and newer

1.15.0 and newer

Amazon Linux Release 2

From Version

To Version

1.16.0

and newer

1.16.0 and newer

Legend

Reboot Not Required

Reboot May Be Required

Reboot Required

Notes

1. Reboot required to update RedirFS kernel module. See CSCvo74991 for details.

2. Reboot required if running RHEL/CentOS 7.5 (3.10.0-862 kernel) or greater. See CSCvn39498 for details.

3. Reboot required to update RedirFS kernel module. See CSCvt25576 for details.

4. Reboot required to update RedirFS kernel modules. See CSCvt54122 and CSCvu07130 for details.