Contents

This table contains reboot requirements for AMP for Endpoints Windows Connector updates.

All versions prior to 5.1.3 require a reboot when upgrading.

Upgrades from any version below 7.x.x to any version above 7.x.x will require a reboot.

Upgrades from any 7.x.x version to any higher 7.x.x version should not require a reboot except in unexpected cases.

Upgrading from 7.2.3.11648 to any later version requires a reboot due to a bug in that version. See CSCvt56075 for more information.

Under certain conditions, if an older DFC driver is present a reboot will be required when upgrading to Connector versions 7.3.1 and newer. See CSCvv20713 for more information.

To Version

5.1.5

5.1.7

5.1.9

5.1.11

5.1.13

6.0.5

6.0.9

6.1.7

6.1.9

6.2.1

6.2.3

6.2.9

6.2.19

6.3.1

6.3.3

6.3.5

6.3.7

7.0.5 and later

From Version

5.1.3

5.1.5

5.1.7

5.1.9

5.1.11

5.1.13

6.0.5

6.0.9

6.1.7

6.1.9

6.2.1

6.2.3

6.2.9

6.2.19

6.3.1

6.3.3

6.3.5

6.3.7

Legend

Reboot not required

Reboot suggested

Reboot required