Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

Configure

Verify

Troubleshoot

Related Information

Introduction

This document describes the process of modifying the Statistics Configuration > Collection Interval in a vManage cluster.

Prerequisites

Requirements

Cisco recommends that you have knowledge of vManage cluster 3 nodes in Active Data Center (DC) and 3 nodes in Disaster Recovery (DR) running 20.6.3 code 3 node vManage cluster.

Components Used

The information in this document is based on the 3-node vManage cluster on the 20.6.3 version.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Background Information

When Deep Packet Inspection (DPI) is enabled, you must set the Statistics Collection timer to 30 minutes or higher. In case, if user has less than 30 minutes configured, you need to configure 30 minutes or higher.

Configure

If you need to change the Database collection Statistics Configuration, it requires a reload of vManage. If it is a cluster of vManage, you need to follow these steps.

1. Ensure the status of the transport interface on DR vManage cluster nodes is Down.

2. From the Cisco vManage menu, navigate to Administration > Disaster Recovery page and pause the DR on Active cluster from any one of the vManage.

3. Change the Statistics collection interval to 30 minutes on Administration > Settings page on one vManage in an active cluster. It changes the timer on other vManages as well. Please validate the same before proceeding to the next step.

4. Reboot all three vManages in the active cluster to confirm the change. Login to all three vManages once they are up (approximately after 30 minutes) and validate that the change has been performed and cluster connectivity is restored.

5. Navigate to Administration > Disaster Recovery page and resume the DR back again.

6. Wait for the next Replication to occur as per the replication interval timer.

7. After replication, the same configuration is present in the DR cluster as well. Please validate the same before proceeding to the next step.

8. Now, you can either pause the DR again and reboot the backup cluster vManages or you can reboot them as it is. Just ensure it is not in the process of replication while the DR vManages is rebooted.

Verify

Navigate to Administration > Statistics Configuration in vManage GUI and verify the Statistics collection interval.

Troubleshoot

There is currently no specific troubleshooting information available for this configuration.

Related Information

Troubleshoot Statistics Database and Disk Ratio on Cisco vManage

Update Statistics Database Settings in Cisco vManage

Technical Support & Documentation - Cisco Systems