Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

Configure

Network Diagram

ConfigureTLOC Extension L3 from vManage GUI

Step 1. Configuration on cEdge-01

Step 2. Configuration on cEdge-02

Configure TlOC Extension L3 from CLI

Verify

Troubleshoot

Introduction

This document describes how to configure TLOC-Extension Layer 3 (L3) on a Software-Defined Wide Area Network (SD-WAN).

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- SD-WAN general overview

- Templates

- TLOC-extension

- Routing Protocols

Components Used

The information in this document is based on these software and hardware versions:

- Cisco vManage Release 20.7.x or later

- vManage Version 20.7.2

- vBond Version 20.7.2

- vSmart Version 20.7.2

- Integrated Service Routers (ISR)4451/K9 Version 17.7.2

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Background Information

The TLOC extension allows a WAN Edge router to:

- Communicate over the WAN transport (connected to the adjacent WAN Edge router) through a TLOC-extension interface.

- Extend the TLOC to have redundancy on transport side.

There are two ways to configure TLOC Extension:

1. Via L2

- Connect another SD-WAN router at the same physical site.

2. Via L3

- Needs a router with L3 capabilities used to configure any routing protocol.

- Connects between SD-WAN devices and non-SD-WAN device.

- Must be via GRE tunnel to extend the TLOC.

Configure

Network Diagram

Configure TLOC Extension L3 from vManage GUI

Note: Must configure a routing protocol to communicate between SD-WAN devices with a non-SW-WAN device. In this example, BGP is configured.

Step 1. Configuration on cEdge-01

1.1 Configure the Interface for TLOC-L3 connection and assign it to tunnel interface.

- In vManage GUI, Navigate to Configuration > Templates > Feature Template > Select Device > VPN Interface Ethernet.

- Configure basic configuration of the Interface, assign an IP address, in this case, interface GigabitEthernet0/0/6.50.

- Navigate to Tunnel section and turn it on. Use the same color that the other SD-WAN device is used as local color, in this scenario, blue.

1.2 Enable TLOC extension statement from the device which gets the TLOC.

- Navigate to Tunnel > Advance Option > GRE Tunnel destination IP.

Note: The IP address must be the interface address assigned to the other SD-WAN device used for L3 connection.

Note: An example is the IP address on cEdge-02 of interface TengigabitEthernet0/0/6.51.

2. Enable TLOC extension statement from where the device gets the TLOC.

Navigate to Tunnel > Advance Option > GRE Tunnel destination IP.

The IP must be the IP address of the interface assigned to the other SD-WAN device, which is used for L3 connection, in this case, the IP address on cEdge-02 of interface TenGigabitEthernet0/0/6.51.

Step 2. Configuration on cEdge-02

2.1  In vManage GUI, navigate to  Configuration > Templates > Feature Template > Select Device > VPN Interface Ethernet.

Note: In this interface, Tunnel must be OFF.

- Configure basic configuration of the Interface.

- Assign an IP address (TenGigabitEthernet0/0/6.51 in this case).

2.2 Navigate to Advance section and complete the information for GRE tunnel source IP.

Note:

- The IP address must be the interface address assigned to the other SD-WAN device used for L3 connection.

- xconnect must be the WAN interface used to send traffic over the extended TLOC.

Note: An example is the IP address on cEdge-02 of interface TengigabitEthernet0/0/6.51.

Configure TlOC Extension L3 from CLI

In this section, you can check how the configuration looks on CLI after template push.

Configuration on cEdge-01:

cEdge-01#show sdwan running-config

system

system-ip             <system_ip>

site-id               <site_id>

organization-name     <organization_name>

vbond <vbond>

!

hostname cEdge-01

!

ip route 0.0.0.0 0.0.0.0 10.31.121.1

interface GigabitEthernet0/0/0

no shutdown

ip address 10.31.121.2 255.255.255.252

exit

interface GigabitEthernet0/0/6

no shutdown

ip mtu 1504

mtu 1504

negotiation auto

exit

interface GigabitEthernet0/0/6.50

no shutdown

encapsulation dot1Q 50

ip address 192.168.50.2 255.255.255.252

exit

interface Loopback100

no shutdown

ip address 10.10.10.10 255.255.255.255

exit

interface Tunnel0

no shutdown

ip unnumbered GigabitEthernet0/0/0

tunnel source GigabitEthernet0/0/0

tunnel mode sdwan

exit

interface Tunnel10101012

no shutdown

ip unnumbered GigabitEthernet0/0/6.50

no ip redirects

ipv6 unnumbered GigabitEthernet0/0/6.50

no ipv6 redirects

tunnel source GigabitEthernet0/0/6.50

tunnel mode sdwan

exit

router bgp 65001

bgp log-neighbor-changes

bgp router-id 10.10.10.10

neighbor 192.168.50.1 remote-as 65003

address-family ipv4 unicast

neighbor 192.168.50.1 activate

network 192.168.50.0 mask 255.255.255.252

exit-address-family

!

sdwan

interface GigabitEthernet0/0/0

tunnel-interface

encapsulation ipsec

color biz-internet

allow-service all

exit

exit

interface GigabitEthernet0/0/6.50

tunnel-interface

encapsulation ipsec

color blue

tloc-extension-gre-to 192.168.51.2

exit

exit

cEdge-01#

Configuration on cEdge-02:

cEdge-02#show sdwan running-config

system

system-ip             <system_ip>

site-id               <site_id>

organization-name     <organization_name>

vbond <vbond>

!

hostname cEdge-02

!

ip route 0.0.0.0 0.0.0.0 10.31.127.1

ip nat inside source list nat-dia-vpn-hop-access-list interface TenGigabitEthernet0/0/0 overload

interface TenGigabitEthernet0/0/0

no shutdown

ip address 10.31.127.2 255.255.255.252

ip nat outside

exit

interface TenGigabitEthernet0/0/6

no shutdown

mtu 1504

exit

interface TenGigabitEthernet0/0/6.51

no shutdown

encapsulation dot1Q 51

ip address 192.168.51.2 255.255.255.252

exit

interface Loopback200

no shutdown

ip address 10.200.200.200 255.255.255.255

exit

interface Tunnel0

no shutdown

ip unnumbered TenGigabitEthernet0/0/0

ipv6 unnumbered TenGigabitEthernet0/0/0

tunnel source TenGigabitEthernet0/0/0

tunnel mode sdwan

exit

router bgp 65002

bgp log-neighbor-changes

bgp router-id 10.200.200.200

neighbor 192.168.51.1 remote-as 65003

address-family ipv4 unicast

neighbor 192.168.51.1 activate

network 192.168.51.0 mask 255.255.255.252

exit-address-family

!

sdwan

interface TenGigabitEthernet0/0/0

tunnel-interface

encapsulation ipsec

color blue

allow-service all

allow-service bgp

allow-service dhcp

allow-service dns

allow-service icmp

no allow-service sshd

no allow-service netconf

no allow-service ntp

no allow-service ospf

no allow-service stun

allow-service https

no allow-service snmp

no allow-service bfd

exit

exit

interface TenGigabitEthernet0/0/6.51

tloc-extension-gre-from 192.168.50.2 xconnect TenGigabitEthernet0/0/0

exit

cEdge-02#

Verify

Validation on cEdge-01:

cEdge-01 must create control connections with local TLOC (biz-internet) and TLOC Extension (blue).

cEdge-01L#show sdwan control connections

PEER                                          PEER                                          CONTROLLER

PEER    PEER PEER            SITE       DOMAIN PEER                                    PRIV  PEER                                    PUB                                           GROUP

TYPE    PROT SYSTEM IP       ID         ID     PRIVATE IP                              PORT  PUBLIC IP                               PORT  ORGANIZATION            LOCAL COLOR     PROXY STATE UPTIME      ID

----------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

vsmart  dtls                 10         1      192.168.21.34                           32953 172.18.121.106                          32953 CISCORTPLAB             biz-internet    No    up     3:00:16:15 0

vsmart  dtls                 10         1      192.168.21.34                           32953 172.18.121.106                          32953 CISCORTPLAB             blue            No    up     3:00:16:20 0

vbond   dtls                 0          0      172.18.121.105                          32853 172.18.121.105                          32853 CISCORTPLAB             biz-internet    -     up     3:00:16:22 0

vbond   dtls                 0          0      172.18.121.105                          32853 172.18.121.105                          32853 CISCORTPLAB             blue            -     up     3:00:16:24 0

vmanage dtls                 10         0      192.168.28.25                           32953 172.18.121.106                          44803 CISCORTPLAB             blue            No    up     3:00:16:18 0

cEdge-01#show sdwan control local-properties

PUBLIC          PUBLIC PRIVATE         PRIVATE                                 PRIVATE                              MAX   RESTRICT/           LAST         SPI TIME    NAT  VM

INTERFACE                IPv4            PORT   IPv4            IPv6                                    PORT    VS/VM COLOR            STATE CNTRL CONTROL/     LR/LB  CONNECTION   REMAINING   TYPE CON REG

STUN                                              PRF IDs

-------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------------

GigabitEthernet0/0/0          10.31.121.87    32853  10.31.121.87    ::                                      32853    1/0  biz-internet     up     2      no/yes/no   No/No  0:00:00:15   0:11:42:53  N    5  Default

GigabitEthernet0/0/6.50       10.31.127.62    5063   192.168.50.2    ::                                      32853    1/1  blue             up     2      no/yes/no   No/No  0:00:00:11   0:11:42:53  N    5  Default

Troubleshoot

In case you have an issue, refer to:

Troubleshoot SD-WAN Control Connections