Contents

Critical temperature condition is observed

ICSeverity

Impact

Description

SyslogMessage

MessageSample

ProductFamily

Regex

Recommendation

Commands

Critical temperature condition is observed

ICSeverity

1 - Alert

Impact

Rising temperature could cause device shutdown.

Description

This message indicates that there is an environmental condition on the device. This could be the temperature readings at various sensors, power supply voltage readings, or RPMs on the various fans. Inside the message text, it can report which sensor or location has seen a condition, and the criticality of the reading.

SyslogMessage

ENVIRONMENTAL-1-ALERT

MessageSample

Oct  8 15:27:38 <> %ENVIRONMENTAL-1-ALERT: Temp: Inlet x Location: Rx State: Critical Reading: xx Celsius

ProductFamily

- Cisco 4000 Series Integrated Services Routers

- Cisco cBR Series Converged Broadband Routers

Regex

N/A

Recommendation

Verify the cards, fans, and chassis status with show environment, show platform or show module, and show logging commands. You need to dispatch a local technician to verify the ambient temperature, airflow, and filter status on the device. Please engage with the support engineer if the issue persists.

Commands

#show version

#show logging

#show module

#show environment all

#show platform

#show clock

#show inventory