Contents

Introduction

This document describes general license-related alarms raised for Network Convergence System 2000 (NCS2k) and the procedure to troubleshoot and install the license.

License Types

1. Evaluation license: The evaluation license is defaulted with all new cards and supports for 180 days (for most of the features).

2. Temporary license: Temporary licenses need to be requested from Cisco.

3. Permanent license: Permanent licenses need to be requested from Cisco.

Alarms and Conditions

Evaluation License in Use

Condition EVAL-LIC or Evaluation license in Use alarm to be raised against card if the feature is provisioned and permanent license not installed.

LICENSE-EXPIRED

Default Severity: Critical (CR), Service-Affecting (SA)

The License Expired (LICENSE-EXPIRED) alarm is raised when an evaluation license or a temporary license expires and there is no other valid license installed on the device. When a switchover of the control card or soft reboot/hard reboot of the target line card is performed. After the reboot, the card raises an LIC-MISSING alarm. Cisco recommends not performing controller switchover or line card reset. It takes down the traffic.

Before the license expires, the user is to be notified with LIC-EXPIRING-SOON (in the range of 1 to 14 days) and LIC-EXPIRING-SHORTLY (in the range of 0 to 24 hours) alarms.

Temporary License (TEMP-LIC)

The alarm is raised just to indicate that a valid temporary license is in use. Installing a permanent license clears the alarm. The alarm is Non-Service-Affecting (NSA).

Caution: Cisco bug ID CSCvz30524  : A TNC switch or Line Card (LC) manreset with an expired license can result in no relevant alarms or a silent trunk laser off condition.

Note: Some card like 400G-XP does not allow the traditional process of a license generated via a PAK, 400G-XP licensing is a "trust-based licensing". CTC does not have a license tab for the 400G-XP card. Other NCS2k cards with trust-based licensing is; NCS2K-FSSMR-2-LIC=.

License Installing

Prerequisites

Collect this info before requesting a license from Global Licensing Operations (GLO):

1. Cisco sales order number

2. License SKU/PID of part

3. Smart account name/domain

4. Virtual account name

5. PAK number if any

6. Card Serial number

Note: Points 2, 5, and 6 are mandatory for new licenses.

Information Needs to be Collected from Cisco Transport Controller (CTC) Application

Sample steps shared for card 200G-CK-LIC and feature 100G_HG_FEC_OR_CD_RANGE:

1. Navigate to  Card view > Provisioning > Licensing > Feature Licenses  as shown in this image.

Feature Licenses table

2. Check  License State.

3. If a value is Unlicensed, select the row from the Feature Licenses table and click on  Manage License Lines  as shown in the image.

License Detail

4. If the license is expired, you need to get a new license file.

5. Mark the license feature name and search for SKU in the card datasheet.

For example:

100G_HG_FEC_OR_CD_RANGE feature is showing Unlicensed Fetch Feature ID (SKU) for 100G_HG_FEC_OR_CD_RANGE feature

1. Open Datasheet for Card 200G-CK-LIC.

2. Look into  Ordering Information  as shown in the image.

Ordering Information for 200G-CK-LIC

Select L-NCS2K-DQPSK-LH= SW license - HG-FEC on 100G CP-DQPSK WDM Trunk port.

6. Fetch UDI information from the Card:

a. Telnet to the node.

b. Navigate to the card.

c. Fetch log for  license_ui_show_udi

WARNING

This system is restricted to authorized users for business purposes. Unauthorize                                                                                                 d

access is a violation of the law. This service may be monitored for administrati                                                                                                 ve

and security reasons. By proceeding, you consent to this monitoring.

ATTENTION!!!

This shell is intended for QUALIFIED PERSONNEL ONLY.  Customer Use of

this shell is not recommended OR supported by the Technical Assistance

Center.  Inappropriate use of shell Commands can have a Negative AND

Service Affecting impact on your network.  Please consult the User

Documentation for appropriate troubleshooting procedures.

To exit without logging in, enter Control-D at the login prompt.

To exit after logging in, type "logout" at the prompt.

Login: CISCO15

Password:XXXXXX

To discontinue logging in, type control-d or wait 60 seconds.

After logging in, type 'enablec' to enable abort key (control-c).

->

-> enablec

value = 3 = 0x3

->

-> shelfConns

ShelfId: ShelfIp:           Link:   Cause:            Dwnld

-------- ------------------ ------- -----------------------

1        192.168.190.160    Full    Prov/Init Complete N        --->Select Shelf and telnet to it's IP

value = 50 = 0x32 = '2'

->

->

->telnet "192.168.190.xxx"                                     ---> Need to enter password (default)

->

->

->caDump                                                      ---> list of cards within shelf. Copy IP for selected Slot

chassis type = M6_ETSI, my slot = 8, myCpu = 0, myCpuId=0x8

max slot=9 max cpuid=0x12

My MAC = D0:0F:02:00:00:02

My IP = 192.168.190.101 (0xC0XXXX65)

bits references per chassis = 2, references per IO slot = 3

Slot      Name       Capabilities                                       SCL       IP        Protection Peer

---- --------------- -------------------------------------------------- --- --------------- ---------- ----

1  TNC-1            1:1-M IO TCC OCN-OK CPU                             0 192.168.190.100     1:1      8

PTP-1            1:1-M CPU PTP                                       2 192.168.190.227     1:1      8

2  IO-1             12 48M2 1:1-M 1:N-M IO OCN-OK CPU                  10 192.168.190.235     1:1      3      1:N     127

3  IO-2             12 48M2 1:N-M 1:1-P IO OCN-OK CPU                  11 192.168.190.11      1:1      2      1:N     127

4  IO-3             12 48M2 1:1-M 1:N-P IO OCN-OK CPU                  12 192.168.190.237     1:1      5

5  IO-4             12 48M2 1:N-M 1:1-P IO OCN-OK CPU                  13 192.168.190.13      1:1      4      1:N     127

6  IO-5             12 48 48M2 192 1:1-M 1:N-M IO OCN-OK CPU            6 192.168.190.6       1:1      7      1:N     127

7  IO-6             12 48 48M2 192 1:N-M 1:1-P IO OCN-OK CPU            7 192.168.190.7       1:1      6      1:N     127

8  TNC-2            1:1-P IO TCC OCN-OK CPU                             1 192.168.190.101     1:1      1

PTP-2            1:1-P CPU PTP                                       3 192.168.190.228     1:1      1

value = 1 = 0x1

->

->

-> telnet "192.168.190.235"                                ---> Login to Card

To discontinue logging in, type control-d or wait 60 seconds.

After logging in, type 'enablec' to enable abort key (control-c).

-> enablec

value = 3 = 0x3

->

-> mManufDisplay

HW Part Number       : 800-4XXX6-06

HW Revision          : A0

Card serial number   : CATXXXXX028

Card Name            : 200G-CK-LC

CLEI Code            : WOTXXXXBAA

Equipment ID         : 0x2828

Application filename : 200G.BIN

Extended Information : 1528.77;50;96;PID=NCS2K-200G-CK-LIC;VID=V06 ;

Firmware Version     : 57-6398-05

Copyright            : Copyright (c) 2001-2006 by Cisco System

->

->

->license_ui_show_udi

Device# PID                     SN                      UDI

--------------------------------------------------------------------------------

*0      NCS2K-200G-CK-LIC       CATXXXXX028             NCS2K-200G-CK-LIC:CATXXXXX028          ---> UDI for card

value

->

-> logout                                        ---> logout from card

telnet: Closed connection.

value = 0 = 0x0

->

7. Share SKU and UDI with the Licensing Team.

8. Once the license file is generated;

1. Navigate to  Card view > Provisioning > Licensing > License Operations.

2. Browse the license file and install it as shown in the image.

3. Then, navigate o to the  Feature Licenses  tab and click on Refresh License Data to verify the installation.

License Operations tab

Troubleshooting

Case 1. Evaluation License in Use

1. If the card is replaced and the evaluation license is in use, the alarm is reported. You need to transfer the license from the old card to the new card.

2. You can rehost the license with Cisco License Portal by referring to this guide.

3. Or, contact Cisco TAC for support.

Case 2. Error: UDI in the License Line does not Match with the Local UDI

Common Scenarios

1. While installing the new license.

2. License transfer.

Common Cause

The error message indicates that the UDI information provided while generating the license does not match the target card.

Fix

Provide the right UDI information and generate the license again.

Steps to fetch UDI information for NCS2k devices are shared in the topic  License Installing.

Case 3. Error: Duplicate License

Common Scenarios

While installing a license for a new feature

Common Cause

License for that feature must be present on the target card.

Fix

Understand which feature license is required. The steps shared helps to list all active feature and licenses on the target card.

Steps to List All Features and Licenses

Sample screenshots are from Card: AR-MXP-LIC

1. Navigate to  Card view > Provisioning > Licensing > Feature Licenses  as shown in the image.
Feature Licenses tab

a. If the base functionality is true, then that feature does not require a license.

b. License State describes whether that feature is provisioned and licensed.

2. Please understand card mode and other provisioning before troubleshooting this issue.

3. For more details on the feature, you need to select that row in the Feature Licenses table and click on Manage License Lines

Manage License Lines button in Feature Licenses

4. New pop-up shows all licenses against that feature (evaluation, temp, and permanent).

Selected License Detail