Contents

Introduction

Remote Node Login from Local Node via TL1 Commands

Introduction

This document describes the method to login reachable remote nodes from local node by TL1.

Remote Node Login from Local Node via TL1 Commands

In the quest to login a remote node from adjacent reachable node, if Cisco Transport Controller (CTC) does not work, you are left with the TL1 method.

This method describes how to login remote node from local logged in node and the steps are:

Step 1. Login to the node and check if the remote node is reachable via any channel, for eg. (DCC/GCC/OSI) or accessible directly by ping.

-> acNodes

========================== AlrmC Nodes =================================

ind Val NodeName          IP Addr      Cri Maj Min N-A N-R Vwire ProdField VirtWrProdNm VirtWireProdEnum MsgVer

--- --- -------------------- ----------------  --- --- --- --- --- -----

0 Yes 206                  10.105.142.206      3   0   2   8   1  xxxx ONS15454  1 400

1 Yes WXC-207              10.105.142.207      0   1   5   6   0  xxxx ONS15454  1 400

2 Yes 197                  10.105.142.197      3   2  11  11   5  xxxx ONS15454  1 400

Step 2. Login via TL1 in local node with the use of this syntax.

Syntax:

ACT-USER:[<TID>]:<uid>:<CTAG>::<pid>;

ACT-USER::CISCO15:123::******;

206 2000-12-15 23:43:21

M  123 COMPLD

"CISCO15:2000-12-15 23-42-43,2000-12-15 23-15-04,0"

;

206 2000-12-15 23:43:21

A  0 REPT EVT SESSION

"206:NO,"

/* TL1 Agent Copyright (c) 1999-2007 Cisco Systems, Inc.

WARNING

This system is restricted to authorized users for business purposes. Unauthorized

access is a violation of the law. This service may be monitored for administrative

and security reasons. By proceeding, you consent to this monitoring.

User CISCO15 logged in from 64.103.228.115 */

;

User CISCO15 logged in from 10.105.142.206 */

;RTRV-ALM-ALL:::123;

206 2000-12-15 23:47:04

M  123 COMPLD

"SLOT-11,EQPT:MN,EQPT,NSA,12-04,03-26-24,NEND,NA:\"Equipment Failure\",TCC"

"LINEWL-17-4-RX-1530.33,OCH:CR,LOS-P,SA,12-09,02-55-16,NEND,NA:\"Incoming Payload Signal Absent\",40-SMR1-C"

"LINEWL-17-4-RX-1531.90,OCH:CR,LOS-P,SA,12-09,02-57-20,NEND,NA:\"Incoming Payload Signal Absent\",40-SMR1-C"

"LINE-17-5-TX,OTS:CR,OPWR-LFAIL,SA,12-09,02-55-19,NEND,NA:\"Optical Power Failure Low\",40-SMR1-C"

"LINE-17-1-TX,OTS:MN,APC-OUT-OF-RANGE,NSA,12-15,22-55-33,NEND,NA:\"APC Cannot Set Value Due To Range Limits\",40-SMR1-C"

Step 3. From the syntax, change the TID and to ACT-USER login for remote node which you want to login. For other commands too you need to use TID value i.e. remote node name.

> ACT-USER:WXC-207:CISCO15:123::******;

WXC-207 2004-06-03 18:50:20

M  123 COMPLD

"CISCO15:2004-06-03 18-23-24,2004-06-03 16-35-48,0"

;

>

WXC-207 2004-06-03 18:50:20

A  0 REPT EVT SESSION

"WXC-207:NO,"

/* TL1 Agent Copyright (c) 1999-2007 Cisco Systems, Inc.

WARNING

This system is restricted to authorized users for business purposes. Unauthorized

access is a violation of the law. This service may be monitored for administrative

and security reasons. By proceeding, you consent to this monitoring.

User CISCO15 logged in from 10.105.142.206 */

For other commands as shown in the example, you need to enter the respective TID values i.e. node name as WXC-207:

> RTRV-ALM-ALL:WXC-207::123;

WXC-207 2004-06-03 18:50:54

M  123 COMPLD

"SLOT-11,EQPT:MN,PROTNA,NSA,05-21,21-55-10,NEND,NA:\"Protection Unit Not Available\",TCC"

"BITS-1,BITS:MN,LOS,NSA,05-21,21-55-25,NEND,RCV:\"Loss Of Signal\","

"BITS-2,BITS:MN,LOS,NSA,05-21,21-55-25,NEND,RCV:\"Loss Of Signal\","

"SYNC-NE,SYNCN:MJ,SYNCPRI,SA,05-21,21-55-25,NEND,NA:\"Primary Synchronization Reference Failure\","

"SYNC-NE,SYNCN:MN,SYNCSEC,NSA,05-21,21-55-25,NEND,NA:\"Secondary Synchronization Reference Failure\","

"PWR-A,EQPT:MN,BAT-FAIL,NSA,05-21,21-55-18,NEND,NA:\"Battery Failure\","

;

Even if you are logged-in to the remote node, you can navigate in any other connected node and change TID for remotes and keep it as blank as TID for local nodes.