Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

Configure

Network Diagram

Address-family ConfigurationMode

Address-family Interface Configuration Mode

Address-family Topology Configuration Mode

Comparison

Availability

Automatic Conversion to Named EIGRP

Verify

Troubleshoot

Introduction

This document describes the named Enhanced Interior Gateway Routing Protocol (EIGRP) mode feature and differences between traditional and named mode.

Prerequisites

Requirements

Cisco recommends that you have basic knowledge of IP Routing and the EIGRP protocol.

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Background Information

The traditional way to configure EIGRP requires various parameters to be configured under the interface and EIGRP configuration mode.

In order to configure EIGRP IPV4 and IPv6, it is required to configure separate EIGRP instances.

Traditional EIGRP does not support Virtual Routing and Forwarding (VRF) in IPv6 EIGRP implementations.

With Named mode EIGRP, everything is configured at a single place under the EIGRP configuration and there are no restrictions as mentioned previously.

Configure

Network Diagram

This image is a sample topology for the rest of the document.

Unlike the traditional method, the EIGRP instance is neither created nor started when this is configured on the router:

R1(config)#router eigrp TEST

The instance is created when address-family and autonomous system number is configured, for example:

R1(config-router)#address-family ipv4 unicast autonomous-system 1

With this named mode, only a single instance of EIGRP needs to be created. It can be used for all address family types.

It also supports multiple VRFs limited only by available system resources.

Be aware that, in the named mode, configuration of the address-family does not enable IPv4 routing as a traditional configuration of IPv4 EIGRP.

A no shut is required in order to start the process:

router eigrp [virtual-instance-name | asystem]

[no] shutdown

Named EIGRP has three modes under which the bulk of the configuration is completed. These are:

- address-family configuration mode - (config-router-af)#

- address-family interface configuration mode - (config-router-af-interface)#

- address-family topology configuration mode - (config-router-af-topology)#

Address-family Configuration Mode

Enter this mode with this command:

R1(config-router)#address-family ipv4 unicast autonomous-system 1

R1(config-router-af)#?

Address Family configuration commands:

af-interface                    Enter Address Family interface configuration

default                         Set a command to its defaults

eigrp                           EIGRP Address Family specific commands

exit-address-family             Exit Address Family configuration mode

help                            Description of the interactive help system

maximum-prefix                  Maximum number of prefixes acceptable in aggregate

metric                          Modify metrics and parameters for advertisement

neighbor                        Specify an IPv4 neighbor router

network                         Enable routing on an IP network

no                              Negate a command or set its defaults

shutdown                        Shutdown address family

timers                          Adjust peering based timers

topology                        Topology configuration mode

In this mode, these parameters can be configured: Networks, EIGRP neighbor, and EIGRP Router-id.

The other two configuration modes of named EIGRP are accessed from this mode.

Traditional Configuration

Interface GigabitEthernet 0/0

ip bandwidth-percent eigrp 1 75

ipv6 enable

ipv6 eigrp 1

ip bandwidth-percent eigrp 1 75

no shut

!

router eigrp 1

eigrp router-id 10.10.10.1

network 0.0.0.0 0.0.0.0

ipv6 router eigrp 1

eigrp router-id 10.10.10.1

no shut

Named Configuration

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

network 0.0.0.0

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

!

address-family ipv6 unicast autonomous-system 1

!

eigrp router-id 10.10.10.1

no shutdown

exit-address-family

Address-family Interface Configuration Mode

This mode takes all the interface specific commands that were previously configured on an actual interface (logical or physical).

EIGRP authentication, split-horizon, and summary-address configuration are some of the options that are now configured here instead of on the actual interface:

R1(config-router-af)#af-interface g0/0

R1(config-router-af-interface)#?

Address Family Interfaces configuration commands:

authentication             authentication subcommands

bandwidth-percent          Set percentage of bandwidth percentage limit

bfd                        Enable Bidirectional Forwarding Detection

dampening-change           Percent interface metric must change to cause update

dampening-interval         Time in seconds to check interface metrics

default                    Set a command to its defaults

exit-af-interface          Exit from Address Family Interface configuration

hello-interval             Configures hello interval

hold-time                  Configures hold time

next-hop-self              Configures EIGRP next-hop-self

no                         Negate a command or set its defaults

passive-interface          Suppress address updates on an interface

shutdown                   Disable Address-Family on interface

split-horizon              Perform split horizon

summary-address            Perform address summarization

Note: You can use the af-interface default command in order to apply the configuration to all the interfaces at once.

Address-family Topology Configuration Mode

This mode provides several configuration options which operate on the EIGRP topology table.

Things like redistribution, distance, offset list, variance and so on can be configured under this mode.

You can enter this mode from the address-family configuration mode.

R1(config-router-af)#topology base

R1(config-router-af-topology)#?

Address Family Topology configuration commands:

auto-summary         Enable automatic network number summarization

default              Set a command to its defaults

default-information  Control distribution of default information

default-metric       Set metric of redistributed routes

distance             Define an administrative distance

distribute-list      Filter entries in eigrp updates

eigrp                EIGRP specific commands

exit-af-topology     Exit from Address Family Topology configuration

maximum-paths        Forward packets over multiple paths

metric               Modify metrics and parameters for advertisement

no                   Negate a command or set its defaults

offset-list          Add or subtract offset from EIGRP metrics

redistribute         Redistribute IPv4 routes from another routing proto

summary-metric       Specify summary to apply metric/filtering

timers               Adjust topology specific timers

traffic-share        How to compute traffic share over alternate paths

variance             Control load balancing variance

Comparison

A comparison between the two configuration modes that were discussed is shown here:

Availability

The EIGRP named configuration is available from these Cisco IOS® releases:

- 15.0(1)M

- 12.2(33)SRE

- 12.2(33)XNE

- Cisco IOS XE Release 2.5

Automatic Conversion to Named EIGRP

There is an automatic method to convert the configuration from the traditional way to the new method.

Inside the EIGRP process, the command eigrp upgrade-cli <EIGRP Virtual-Instance Name> needs to be entered.

This automatically converts the configuration to the named mode without an impact to the established EIGRP peering:

Traditional Configuration

router eigrp 1

network 10.10.10.1 0.0.0.0

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

ip hello-interval eigrp 1 100

Configuration

R1(config)#router eigrp 1

R1(config-router)#eigrp upgrade-cli TEST

Configuration is converted from router eigrp 1 to router eigrp TEST.

Are you sure you want to proceed? ? [yes/no]: yes

*Oct 10 14:14:40.684: EIGRP: Conversion of router eigrp 1 to router eigrp TEST -

Completed.

Converted Named Configuration

router eigrp TEST

!

address-family ipv4 unicast autonomous-system 1

!

af-interface Ethernet0/0

hello-interval 100

exit-af-interface

!

topology base

exit-af-topology

network 10.10.10.1 0.0.0.0

exit-address-family

Verify

There is currently no verification procedure available for this configuration.

Troubleshoot

There is currently no specific troubleshooting information available for this configuration.